^rH685 Manual & Automatic RAT^r

Selectively disabling  Manual & Auto RAT  per Trakmode  is possible
through  Option  H633 Trakmode. 

This option is incompatible if option H693 RAT X Tone selectable and
Std. Call Code is enabled and both codes have variable digits on the 
same channel. If both variable codes are required you have to disable
H685 Manual & Automatic RAT on this channel on the trakmode table.

This option requires one of the following options:

         H692 RAT X Tone sequential
         H693 RAT X Tone selectable
         H633 Trackmode- RAT X Tone per Mode
         H633 Trackmode- RAT X Tone selectable
Incompatible options:

         H642 Decode only
         H809 Omit 5 Tone Enc./Dec.
         H966 Unit ID before and after Call
       * H959 Unit ID before Call
       * H977 Unit ID after Call

       * Incompatible only if ordered with Auto Call Repeat (2X)


Applicable Models: MX1000, MX2000, MX3000

                 * * *  END  OF  HELP  TEXT  * * *
