^rH688 Flat Audio Response^r

This  option  removes the  standart 6 dB per  octave preemphasis (TX)
and deemphasis (RX) to provide direct FM.

Applicable Models: MX1000, MX2000, MX3000


                 * * *  END  OF  HELP  TEXT  * * *
