^rH692 RAT X Tone Sequential^r
Following digits are allowed  to be entered:  "0-9,G,R,J,K,L,M". It is
not required to define the "R"  tone when equal numbers are following.
The software accepts sequences like "11122".
Deleting this  option  will  reset H975  Unit  ID after RAT  if it was
enabled.

Incompatible options:

         H642 Decode only
         H809 Omit 5 Tone Enc./Dec.

Applicable Models: MX1000, MX2000, MX3000

                 * * *  END  OF  HELP  TEXT  * * *
