^rH693 RAT X Tone Selectable^r

The following digits may be entered: "0-9,G,R,J,K,L,M". It is not required
to define the "R"  tone when equal numbers are following. The software
accepts sequences like "11122".

The varible positions have to be defined below the required  tone code
positions. Tone code position that  have to be fixed can be entered with 
the space key " " or the "_" key.

When no variable position is defined  then H692  RAT X Tone Sequential
becomes enabled after the incompatibility check is made.
To select the XTONVAR data field the [TAB] key has to be used.

Deleting this  option  will  reset H975  Unit  ID after RAT  if it was
enabled.
Incompatible option:

         H642 Decode only
         H809 Omit 5 Tone Enc./Dec.


Applicable Model: MX3000

                 * * *  END  OF  HELP  TEXT  * * *
