^rHelp for NON Standart Repeat Tone ^r

With this option 0-9 may be selected as the repeat tone.


Incompatible options:

         H809 Omit 5 Tone Enc./Dec.


Applicable Models: MX1000, MX2000, MX3000

                 * * *  END  OF  HELP  TEXT  * * *
