^rH736 Format Modified ZVEI^r

Enabling  this  option  will  set all  Select  5  decoder  and encoder
frequencies to the Modified ZVEI tone set.


By changing the signalling format following options are deleted:

        - H746 Extended 1st Tone Enc./Dec.
        - H687 Extended 1st Tone on RAT


 



The H736 Modified ZVEI Tone set will be:

     Tone    Frequency  | Tone   Frequency  | Tone   Frequency
     Number    (Hz)     | Number   (Hz)     | Number   (Hz)
     -------------------+-------------------+------------------
       1        970     |   5      1400     |   9      2000
       2       1060     |   6      1530     |   0      2200
       3       1160     |   7      1670     |   G       885
       4       1270     |   8      1830     |   R      2400

     The tone duration will be 70 ms. 


Incompatible options:

     H809 Omit 5 Tone Enc./Dec.

Applicable Models: MX1000, MX2000, MX3000

                 * * *  END  OF  HELP  TEXT  * * *
