^rH737 Format 70 msec. CCIR^r



Enabling  this  option  will  set all  Select  5  decoder  and encoder
frequencies to the 70 ms CCIR tone set.


By changing the signalling format following options are deleted:

        - H746 Extended 1st Tone Enc./Dec.
        - H687 Extended 1st Tone on RAT




The H737 70 ms CCIR tone set will be:

     Tone    Frequency  | Tone   Frequency  | Tone   Frequency
     Number    (Hz)     | Number   (Hz)     | Number   (Hz)
     -------------------+-------------------+------------------
       1       1124     |   5      1446     |   9      1860
       2       1197     |   6      1540     |   0      1981
       3       1275     |   7      1640     |   G      2400
       4       1358     |   8      1747     |   R      2110

     The tone duration will be 70 ms. 

Incompatible options to this option:

         H809 Omit 5 Tone Enc./Dec.

Applicable Models: MX1000, MX2000, MX3000

                 * * *  END  OF  HELP  TEXT  * * *
