^rH741 Standard Group Call^r

This  option  requires  a Decoder Code.  For  STIC  form compatibility
a maximum of 5 groupcall positions can be defined.                      

^rNote:^r The group call digit defined must not be used as part of the
      decode code.


This option requires one of the following options:

         STD. Decode Code
         H633 Trakmode- Decode Code per Mode
                                            



Incompatible options:

         H924 Encode only
         H809 Omit 5 Tone Enc./Dec.


Applicable Models: MX1000, MX2000, MX3000

                 * * *  END  OF  HELP  TEXT  * * *
