^rH742 Single Tone Table^r

This table contains the single tone frequencies and duration  that can
be defined for the tones "J", "K", "L" and "M".
The defaults for the frequencies are:
J = 1750 Hz, K = 2135 Hz, L = 885 Hz and M = 2800 Hz.
The duration is set per default to 600 msec.

Allowed data ranges:

     Keyword    Field Programmer    Stic Form

     STFREQ_    300 - 3000 Hz       300 - 3000 Hz
     DURAT       40 - 9999 ms        40 - 9900 ms


The field programmer  automatically rounds  up  the data  entry to the
next valid duration the radio will handle.
                    

Applicable Models: MX1000, MX2000, MX3000

                 * * *  END  OF  HELP  TEXT  * * *
