^rH746 Extended First Tone Enc/Dec^r
                                             
The programmer automatically rounds up the duration to  the next value
that is accepted by the radio software.
Single  Tones may not  be  entered  as  the  first  tone  in  the call
sequence, because the programmed extended first tone duration won't be
match with the displayed one.


Allowed data ranges for:

All  ZVEI Signalling Formats     :  70 - 1470 ms  in  70 ms increments
H712 CCIR Signalling Format      : 100 - 1500 ms  in 100 ms increments
H737 70 ms CCIR Signalling Format:  70 - 1470 ms  in  70 ms increments
H745 EEA        Signalling Format:  40 - 1480 ms  in  40 ms increments

This option requires one of the following options:

         STD. Call Code
         STD. Decode Code
         H633 Trakmode- Call Code per Mode   
         H633 Trakmode- Decode Code per Mode
 

Incompatible options:

          H809 Omit 5 Tone Enc./Dec.
          H623 Emergency Encode Lockout




Applicable Models: MX1000, MX2000, MX3000

                 * * *  END  OF  HELP  TEXT  * * *
