^rH768 Format French Modified ZVEI^r

Enabling  this  option  will  set all  Select  5  decoder  and encoder
frequencies to the French Modified ZVEI tone set.


By changing the signalling format following options are deleted:

         H746 Extended 1st Tone Enc./Dec.
         H687 Extended 1st Tone on RAT






The H768 French Modified ZVEI tone set will be:

     Tone    Frequency  | Tone   Frequency  | Tone   Frequency
     Number    (Hz)     | Number   (Hz)     | Number   (Hz)
     -------------------+-------------------+------------------
       1       1060     |   5      1530     |   9      2200
       2       1160     |   6      1670     |   0      2400
       3       1270     |   7      1830     |   G       885
       4       1400     |   8      2000     |   R       970
 
      The tone duration will be 70 ms. 


Incompatible options:

     H809 Omit 5 Tone Enc./Dec.
        

Applicable Models: MX1000, MX2000, MX3000

                 * * *  END  OF  HELP  TEXT  * * *
