^rH930 PTT Monitor^r


This option can be enabled on all channels that will have a PL Decoder
and/or a Select 5 decoder enabled.


This option requires one of the following option:

         Decode Code (STD.)
         PL Decode Code (STD.)

  



Incompatible options:
           
       * H924 Encode only
       * H809 Omit 5 Tone Enc/Dec
         H273 Operator selectable Scan List
         H344 Channel slaved Scan List
         H632 Authorization w/ Single Tone Reset
         H960 Unit ID once on PTT

       * Not incompatible if a PL decode code has been ordered
  

Applicable Models: MX1000, MX2000, MX3000

                 * * *  END  OF  HELP  TEXT  * * *
