^rH944 Non STD. Receive Response Time^r


This option requires a scan function in the radio.  When enabling H273
and/or  H344  in the radio  then "H944  Receive Response Time" becomes
enabled with 3 sec. default.


This option requires one of the following options:

         H273 Operator selectable Scan
         H344 Channel slaved Scan




Incompatible options:

         H365 Transmit Inhibit on busy Channel
         H930 PTT Monitor


Applicable Models: MX2000, MX3000

                 * * *  END  OF  HELP  TEXT  * * *
