^rH958 Unit ID on PTT^r

The enabled option allows the UNITID code to be changed. Modifying this
UNITID code will  also  modify any UNITID code  in H959,  H977, H966 or
H975 if enabled.
Following digits are allowed  to be entered:  "0-9,G,R,J,K,L,M". It is
not required to define the "R"  tone when equal numbers are following.
The software accepts sequences like "11122".
The option cannot be disabled if one of  H368  Short Call Alphanumeric
or  H369  Programmable  Numeric Short Call  is  enabled,  because they
require a Unit ID protocol and a UNIT ID CODE per radio. Do not try to
remove the unit id code on trakmodes.




Incompatible options to this option:

         H642 Decode only
         H809 Omit 5 Tone Enc./Dec.


Applicable Models: MX1000, MX2000, MX3000

                 * * *  END  OF  HELP  TEXT  * * *
