^rH959 Unit ID before Call^r

The enabled option allows the UNITID code to be changed. Modifying this
UNITID code   will  also  modify any  UNITID code in  H958, H976, H663,
H682, H960 or H975 if enabled.
The following digits are allowed  to be  entered:  "0-9,G,R,J,K,L,M". It is
not required to define  the "R"  tone when equal numbers are following.
The software accepts sequences like "11122".
                                             
Incompatible options:

         H642 Decode only
         H809 Omit 5 Tone Enc./Dec.
       * H685 Manual & Automatic Repeater
 
       * Incompatible only if ordered with Auto Call Repeat (2X)


Applicable Models: MX1000, MX2000, MX3000

                 * * *  END  OF  HELP  TEXT  * * *
