^rH962 Emergency Scheme B^r

This option may require a hardware change. The control top frame and
escutcheon must have an emergency button fitted.

Disabling this option will reset all user  defined Emergency  data and
options. Enabling this option will set following default values:

   | Keyword            | Scheme A | Scheme B | Scheme C |
   |--------------------+----------+----------+----------|
   | EMERID   (code)    : 00000    | 00000    | 00000    |
   | RESETID  (code)    : 00000    | 00000    | 00000    |
   | EMERSNG  (J,K,L,M) : J        | not used | J        |
   | EMERTX   (sec)     : 10       | 10       | 10       |
   | EMERRX   (sec)     : 10       | 10       | 10       |

Applicable Models: MX1000, MX2000, MX3000

                 * * *  END  OF  HELP  TEXT  * * *
