^rH963 Emergency Scheme C^r

This option may require a hardware  change. The control  top frame and
escutcheon must have an emergency button fitted.

Disabling this option will reset all user  defined Emergency  data and
options. Enabling this option will set following default values:

   | Keyword            | Scheme A | Scheme B | Scheme C |
   |--------------------+----------+----------+----------|
   | EMERID   (code)    : 00000    | 00000    | 00000    |
   | RESETID  (code)    : 00000    | 00000    | 00000    |
   | EMERSNG  (J,K,L,M) : J        | not used | J        |
   | EMERTX   (sec)     : 10       | 10       | 10       |
   | EMERRX   (sec)     : 10       | 10       | 10       |
                                                            
The Emergency Scheme C defined  singletone should not be used in other
call sequences.

Applicable Models: MX1000, MX2000, MX3000

                 * * *  END  OF  HELP  TEXT  * * *
