^rH966 Unit ID before and after Call^r

The enabled option allows the UNITID code to be changed. Modifying this
UNITID  code  will  also  modify any  UNITID code in  H958, H976, H663,
H682, H960 or H975 if enabled.
Following digits are allowed  to be entered:  "0-9,G,R,J,K,L,M". It is
not required to define the "R"  tone when equal numbers are following.
The software accepts sequences like "11122". 

Incompatible options to this option:

         H642 Decode Only
         H809 Omit 5 Tone Enc./Dec.
         H683 Auto Call Repeat (2X)
         H685 Manual & Automatic Repeater 

Applicable Models: MX1000, MX2000, MX3000

                 * * *  END  OF  HELP  TEXT  * * *
