^rH967 Emergency Scheme D^r

This option may require a hardware change. The control top frame and
escutcheon must have an emergency button fitted.

Disabling this option will reset all user  defined Emergency  data and
options. Enabling this option will set following default values:

                 EMERID : J00000

Contrary  to the  STIC form the required single tone frequency  can be
entered directly in the EMERID code field.  To be STIC form compatible
a  single tone (J,K,L,M)  is required in the first or last position of
the  data  field.  The  field  programmer  itself  does not check this
requirement to allow more flexibility.

Applicable Models: MX1000, MX2000, MX3000

                 * * *  END  OF  HELP  TEXT  * * *
