^rH975 Unit ID after RAT^r

This option requires one of the Repeater Options H692 or H693.
The enabled option allows the UNITID code to be changed. Modifying this
UNITID  code  will  also  modify any  UNITID code in  H958, H976, H663,
H682, H960, H959, H977 or H966 if enabled.
The following digits are allowed  to be entered:  "0-9,G,R,J,K,L,M". It is
not required to define the "R"  tone when equal numbers are following.
The software accepts sequences like "11122".


This option requires one of the following:

         H692 RAT X Tone sequential
         H693 RAT X Tone selectable
                                              
Incompatible options:

         H642 Decode Only
         H809 Omit 5 Tone Enc./Dec.


Applicable Models: MX1000, MX2000, MX3000

                 * * *  END  OF  HELP  TEXT  * * *
