^rH976 Unit ID upon dekey of PTT^r

The enabled option allows the UNITID code to be changed. Modifying this
UNITID code  will also  modify any UNITID code  in H959,  H977, H966 or
H975 if enabled.
The Following digits are allowed  to be entered:  "0-9,G,R,J,K,L,M". It
is not required to define the "R"  tone when equal numbers are following.
The software accepts sequences like "11122".
                                             
Incompatible options:

         H642 Decode Only
         H809 Omit 5 Tone Enc./Dec.
         H368  Short Call Alphanumeric
         H369  Programmable Numeric Short Call 

Applicable Models: MX1000, MX2000, MX3000

                 * * *  END  OF  HELP  TEXT  * * *
