016560100000167688013000055771601901006451210200000737339021000089671502200009653130222001014415022300107681602250011582160227001243016022900132700802600013676120262001401815026210145760502622014772070262301503808026240153930502625015589100264001596314026900164591503000017139600330001981143033010216261003302022021100350002250621037000235152903701024635040371002482822037110258140904000026192370500002809339052000297191305600030294040600003047906064000307901506600031292170670003206918068000328561409000033525270930003471642093010366400909302036973120930303755915097000383362609701039616080970203987810097030401330809704040445080970504075708097060410230809707041288070420004155016042010423740704202042654160420304371107042040440542204206045164070420704553607042080457951204209046305150421004694910042110475220504220047830070452304824609045250487010904500049190140450104994714045020506190504503050790090450405109810045070514601404508051808260450905291226045100540481904511054889190451205572120045130566861304514057295130451505780407045160582381404521058862060452205904811045240596631904526060566080452706102808045280614900704529061815040453006202105045610623312804580063630120458106416911045820646190404583064754080458406506914045850657351604586066383120458706689013045880672931404589067923130460006834705047000685630604702068849100470306944930047040709150904705071113040470607127611047070719391304708072653080470907311212047110738471004714074450140471507519815047160761050804717076468150471807738022047190782931404720078971130472307976606047240800800504725080384040472608057704047270808090504728081045080472908140907047300817550804731082278050000008258900.m
.m
.p
.o
..
MAIN MENU                                                              1000

The  MAIN  Menu is the top level of the program from which you  select  the 
type of function that you wish to perform.  All selections are made via the 
"Function  Keys", labeled F1 thru F10, on your keyboard.  Press the  ESCape 
key to return to the MAIN Menu from any where in the program.
                                                                         
After  making a selection, you will be directed to similar menus and  /  or 
data  entry screens for RF alignment or codeplug data.  You must  initially 
load  data from a radio (or  disk) via the F3 GET/SAVE function before  you 
will be permitted to CHANGE or VIEW any codeplug data.

Call   Radius   Product Services 800-356-1520 in  Mt.   Pleasant, Iowa  for 
problems  not covered in your Radio Service Software User's manual or  your 
radio Service manual.
.P
MAIN MENU (cont)

Function Key Descriptions:

F1 - Additional  information  is available for every menu via the  F1  HELP 
     key.    Specific  help is also available for each field  on  all  data 
     entry  screens.  Generic help is available within any HELP screen  via 
     the MORE HELP function.

F2 - SERVICE  is a multi-level menu that permits access to radio  ALIGNMENT 
     and   PARTS  REPLACEMENT   screens.   Radius   contains  no   internal 
     alignment  or tuning adjustments; all alignment is performed  via  the 
     SERVICE screens.   

P
MAIN MENU (cont)

     A radio must be connected to your computer via the RIB before you will 
     be  permitted  to  access the SERVICE screens.   All  SERVICE  screens 
     access  the codeplug directly; therefore, you do NOT have to read  the 
     codeplug  data (via the GET/SAVE functions) before using  the  SERVICE 
     screens.  
 
F3 - GET/SAVE is used to read codeplug data from a radio and/or retrieve an 
     archived  codeplug from a diskette or hard disk for  editing  purposes 
     (via  the  CHANGE/VIEW function).  GET/SAVE is also  used  to  program 
     edited codeplug data back into the radio or to create an archive  file 
     on a diskette (or hard disk).  

P
MAIN MENU (cont)

F4 - CHANGE/VIEW  is  a multi-level menu that is used to change,  view,  or 
     modify  codeplug  features and option  configurations.     All  Radius  
     codeplug  parameters  are classified as either RADIO-WIDE  or  CHANNEL 
     related.  CHANGE/VIEW permits access to each of these categories.

     Unlike  the  SERVICE  function, a codeplug must be  loaded  into  your 
     computer's  memory (via the GET/SAVE functions) before you can  access 
     the CHANGE/VIEW screens.  You may CHANGE/VIEW an archive file  without 
     a radio connected.  




.P
MAIN MENU (cont)

F5 - A PRINT utility is available to produce permanent records of   codeplug 
     configurations  and/or RF alignment settings.  A printer  is   required 
     and should be connected to your computer per your instruction manual.

F6 - A FILE MAINTENANCE utility is available to create sub-directory  paths, 
     delete old archive files, restore archive files, and create new back-up 
     files.

F7 - Not Used.

F8 - Not Used.


.P
MAIN MENU (cont)

F9 - SETUP  is  used to configure your  Radius  Radio Service  Software  to 
     your  particular  application.   Default  disk  drives,  communication 
     ports,  and  even  screen colors may be customized  to  your  specific 
     needs.

F10 - Select  EXIT  to quit the program and return to  DOS.   Be  sure  all 
      desired codeplug changes have been programmed back to the radio,  and 
      that  an archive copy has been made.   Otherwise all changes will  be 
      lost  since  returning  to DOS erases this data from  the  computer's 
      memory. 


.P
     
                            KEYBOARD OPERATION

      TAB (or ENTER):         Advance Cursor to Next Data Field
      Shift TAB:              Backup Cursor to Last Data Field
      UP / DOWN Arrow Keys:   Increment / Decrement Value or Selection
      LEFT / RIGHT Arrow:     Move Cursor Within Data Field
      INSERT:                 Insert Space at Current Cursor Position
      BACKSPACE:              Erase Data Within Field & Move Cursor Left
      DELETE:                 Erase Current Character
      PAGE UP / PAGE DN:      Scroll Displayed Data UP or DOWN
      HOME:                   Move Cursor To Upper Left Data Field
      F1:                     Additional Information
      F2 - F8:                Execute Labeled Function
      F10:                    Return to the PREVIOUS Menu
      ESC:                    Return to the MAIN Menu
.P

MOTOROLA Radio Service Software             Radius  P110
                                                       
Part # (3 1/2).......HVN9852                Model #........
                                            Serial #.......
Serial #.............                       Software Ver...
Software Version.....
Date.................                       Band...........
                                                  
Manual #.............6880901Z29 (P110)
                                                 

RIB Part #...........01-80353A74
                     HLN9214A                  
.P
CABLE Part #'s                                    
  PC/XT -> RIB.......30-80369B71
                     HKN9215A                   
  AT    -> RIB.......30-80369B72
                     HKN9216A                  
  RIB   -> Radio.....30-80070N01                  
                     HKN9857A
.P

SERVICE                                                                2000

All radio alignment and parts replacement procedures are accessed from  the 
SERVICE  menu.   A radio must be connected to your computer via a  RIB  and 
cables  and the radio turned on before you will be permitted to access  the 
SERVICE screens. 
                             !!!  WARNING  !!!

Do  NOT switch radios in the middle of any SERVICE procedure.   Always  use 
the EXIT key to return to the previous menu screen before disconnecting the 
radio.  

Call  Radius  Product Services  (800) 356-1520 in Mt.  Pleasant,  Iowa  for 
problems  not covered in your Radio Service Software User's manual or  your 
radio Service manual.
.P
SERVICE (cont)

All  SERVICE screens read and program the radio codeplug directly;  you  do 
NOT  have to use the GET/SAVE functions unless you are editing or  printing 
data.   You will be prompted at each SERVICE screen to save the new  values 
before exiting the screen.

Refer  to your  Radius  Radio Service Software User's Manual  for  detailed 
service procedures.



P
SERVICE (cont)

Function Key Descriptions:

F2 - The ALIGNMENT function is used to perform standard radio alignment  on 
     Level Set Deviation, Transmitter  VCO Deviation,  Reference Oscillator 
     Warp, and  Transmitter Power Set.

F6 - The  BOARD REPLACEMENT function is used for servicing the  radio  when 
     board   repairs   and/or  replacement  are   required.    Step-by-step 
     instructions are given for all re-alignment procedures.
.P

BLANK BOARD INITIALIZATION                                             2100

Refer to your Radius Radio Service Software User's Manual for Replaced  
Main Board procedures.

It is important that the information on the BLANK BOARD INITIALIZATION 
screen is correct. Once an un-initialized codeplug is programmed with model 
definition data it CAN NOT BE CHANGED AGAIN. If the codeplug is incorrectly 
initialized the logic board will have to be replaced again.

Review the information on the screen and if incorrect, edit the information. 
Press F8 to program the model definition data into the radio's codeplug. 

Press F10 to return to the BOARD REPLACEMENT MENU. 
.P

ALIGNMENT                                                              2200

Refer  to your  Radius  Radio Service Software User's Manual for  ALIGNMENT 
procedures.

Standard  periodic  alignment procedures are performed from  the  ALIGNMENT 
Menu.  These include:

              Level Set Adjustment
              Transmitter VCO Deviation Adjustment
              Reference Oscillator Warp Adjustment
              Transmitter Power Set 
              Squelch Adjustment
.P
LEVEL SET                                                              2220

This  alignment  screen allow the  values for  Maximum  Volume,  Microphone 
Gain, System Deviation and PL/DPL Deviation to be set.

Maximum Volume sets the peak volume range for the volume control.

Microphone Gain can be adjusted to four levels of sensitivity.

System Deviation adjusts the total modulation of the carrier frequency.

PL/DPL deviation can be varied over a narrow range.

The  System Deviation and the PL Deviation CANNOT be cloned when using  the 
Smart Cloning Adapter or the cloning function key. o@; 
.P
DEVIATION                                                              2230

Refer  to  your   Radius   Radio Service Software  User's  Manual  for  the 
DEVIATION ADJUSTMENT procedure.

Transmitter  Deviation is increased or decreased by first keying the  radio 
via  F6,  and  then by pressing the UP/DOWN  arrow  keys  respectively.   A 
relative  deviation  value will be displayed, but  the  actual  transmitter 
deviation  must  be determined from your service monitor.  The  radio  will 
transmit  on  the test frequencies displayed on the screen  and  should  be 
terminated into a 50 ohm load or service monitor.  

Using  the UP/DOWN arrow keys, adjust Tx Deviation per your User's  Manual. 
Press F6 again to de-key the radio, and then press F8 to program the  value 
to the radio.
.P

REFERENCE OSCILLATOR WARP                                              2250

Refer  to  your   Radius   Radio Service Software  User's  Manual  for  the 
REFERENCE OSCILLATOR WARP ADJUSTMENT procedure.

The  Reference Oscillator is warped by first keying the radio via  F6,  and
then  by  pressing the UP/DOWN arrow keys respectively.   A  relative  warp 
position  will be displayed, but the actual transmitter frequency  must  be 
determined from your frequency counter or service monitor.  The radio  will 
transmit  on  the  test frequency displayed on the  screen  and  should  be 
terminated into a 50 ohm load or service monitor.

Using  the UP/DOWN arrow keys, adjust the Reference Oscillator Warp to  the 
displayed frequency.  Press F6 again to de-key the radio, and then press F8 
to program the value to the radio.
.P

TRANSMITTER POWER                                                      2270

Refer  to  your   Radius   Radio Service Software  User's  Manual  for  the 
TRANSMITTER POWER ADJUSTMENT procedure.

Transmitter Power is adjusted by first keying the radio via F6, and then by 
pressing the UP/DOWN arrow keys to increase or decrease power respectively. 
A  relative Tx Power value (not watts!) will be displayed, but  the  actual 
transmitter power output must be determined from your service monitor.  The 
radio  will  transmit  on the test frequency displayed on  the  screen  and 
should be terminated into a 50 ohm load or service monitor.

Using the UP/DOWN arrow keys, adjust the Transmitter Power per your  User's 
Manual.   Press F6 again to de-key the radio, and then press F8 to  program 
the value to the radio.
.P

SQUELCH                                                                2290

This aligment screen adjusts the carrier squelch opening threshold  for all
channels of the radio.   Lower values indicate looser squelch, while higher
numbers tighten the squelch.   The radio will automatically  be placed into
CSQ operation  to perform  this adjustment.   The current  frequency wil be 
displayed.
.P

PARTS REPLACEMENT                                                      2600

Refer to your  Radius  Service Manual for PARTS REPLACEMENT procedures.

Calibration is required after the following parts replacement:

                   Main Board
                   Power Amplifier o@; 
                   Squelch Adders


.P

MAIN BOARD                                                             2620

Refer to your  Radius Service Manual for MAIN BOARD REPLACEMENT procedures.

This  menu is structured for execution of the calibration procedures  in  a 
top-to-bottom order to ensure proper calibration.

Steps  7 & 8 are model-dependent and will be by-passed for  non  applicable 
models.

                             !!!  WARNING  !!!

After  Step  8  is completed, the radio codeplug should be  READ  and  then 
archived (SAVED) via the GET/SAVE functions.
.P

REFERENCE CRYSTAL DATA                                                 2621

Refer  to your  Radius  Radio Service Software User's Manual  for  entering 
the Crystal Coefficient Data.  
.P

CALIBRATE Tx POWER                                                     2622

Refer  to  your   Radius   Radio Service Software  User's  Manual  for  the 
TRANSMITTER POWER CALIBRATION procedure. 

This procedure is used to calibrate the power amplifier.
.P

CALIBRATE Tx DEVIATION                                                 2623

Refer  to  your   Radius   Radio Service Software  User's  Manual  for  the 
TRANSMITTER DEVIATION CALIBRATION procedure. 

This screen is very similar to the Calibrate Tx Power  screen,  except that 
the scale represents the deviation adjustment instead of power.
.P

PL DEVIATION                                                           2624

Refer  to  your  Radius  Radio Service Software User's Manual  for  the  PL 
DEVIATION ALIGNMENT procedure. 
.P

DPL DEVIATION                                                          2625

Refer  to  your  Radius  Radio Service Software User's Manual for  the  DPL 
DEVIATION ALIGNMENT procedure. 

                             !!!  WARNING  !!!  

After  Step  8  is completed, the radio codeplug should be  READ  and  then 
archived (SAVED) via the GET/SAVE functions.
.P

POWER AMPLIFIER                                                        2640

Refer  to  your  Radius  Service Manual for the POWER AMPLIFIER REPLACEMENT
procedures.

This  menu is structured for execution of the calibration procedures  in  a 
top-to-bottom order to ensure proper calibration.


                             !!!  WARNING  !!!   o@; 

After  Step  2  is completed, the radio codeplug should be  READ  and  then 
archived (SAVED) via the GET/SAVE functions.
.P

SQUELCH ADDERS                                                         2690

Refer to your Radius Service Manual for the  SQUELCH CALIBRATION procedure.

This proceudre  adjusts  the carrier  squelch opening  threshold for  each
channel  position  of the radio.   The adjustment  will  be made  on  each
channel's appropriate frequency.  This allows you to customize the squelch
for interference patterns or personal preference.

The radio will  automatically be placed into CSQ operation to perform this
adjustment.  The current frequency will be displayed.

This information can  be cloned  using  the Smart Cloning  Adapter  or the 
cloning function key.
P.
.P
GET/SAVE                                                               3000

The  GET/SAVE functions are used to transfer codeplug data from your  radio 
or an archive file into your computer in order for you to Change, View,  or 
Print it.  GET/SAVE functions also permit you to PROGRAM modified data back 
into your radio or to SAVE a copy of the codeplug data in an archive file.

                             !!!  WARNING  !!!

Do  NOT  turn  off  the radio or disconnect  it  from  the  computer  while 
attempting  to PROGRAM the codeplug.  Interrupting the programming  process 
WILL destroy the codeplug contents and completely DISABLE the radio!


.P
GET/SAVE (cont)

Function Key Descriptions:

F2 - The READ CODEPLUG function reads the information (data) stored in  the 
     radio codeplug (EEPROM) and transfers it to the computer's memory.

     A  radio and RIB must be properly connected to the computer and  power 
     turned on before you attempt the READ function.

     The  time  required to READ a codeplug will depend  directly  on  your 
     computer  type  and  the size of the codeplug you  are  reading.   The 
     status of the READ operation is displayed at the bottom of the screen.

P
GET/SAVE (cont)

F3 - The  GET  FILE  function is used to retrieve an archive  file  from  a 
     diskette  or hard disk to the computer.  Once retrieved, the file  may 
     be  modified via the CHANGE/VIEW functions or programmed into a  radio 
     just  as  codeplug  information read from the radio via  the  F2  READ 
     function.

F5 - The  CLONE  CODEPLUG  function is used to copy personality information
     from a master radio  or  archive file into one or more  target radios.

P
GET/SAVE (cont)

F7 - The  SAVE FILE function is used to create (or update) an archive  copy 
     of the codeplug information onto a diskette or hard disk.   An archive 
     copy  of every radio installed or serviced is STRONGLY recommended  in 
     order to be able to quickly restore customer information is case of  a 
     codeplug failure.  

P
GET/SAVE (cont)

F8 - The PROGRAM CODEPLUG function is used to transfer codeplug information 
     from the computer to the radio codeplug.  

     A  radio and RIB must be properly connected to the computer and  power 
     turned on before you attempt the PROGRAM function.
 o73 
     The  time required to PROGRAM a codeplug will depend directly on  your 
     computer  type and the size of the codeplug you are programming.   The 
     status  of  the PROGRAM operation is displayed at the  bottom  of  the 
     screen. 
.P

GET FILE                                                               3300

The  GET FILE function is used to retrieve an archive file from a  diskette 
or hard disk.  Once retrieved, the file may be modified via the CHANGE/VIEW 
functions or programmed into a radio just as codeplug information read from 
the radio via the F2 READ function.

Use  the TAB (or ENTER) key to select the serial number of the radio to  be 
retrieved.    The  corresponding  model  number,   customer  identification 
information,  and  the date the file was made will be displayed across  the 
middle  of  the screen.    The F8 function key is used to GET the  selected 
file as described below.


.P
GET FILE (cont)

Function Key Descriptions:

F2 - The  CHANGE  ARCHIVE function is used to specify  the  directory  path 
     where  the  archive file is to be located.   The default archive  path 
     will  always be the specified default path  from the SETUP  Menu  (See 
     MAIN MENU, F9).

F5 - The  CLONE function copies the serial number and tuning data  from  an 
     archive  file and overlays this information over the current  data  in 
     the computer's memory.



P
GET FILE (cont)

F6 - The  ENTER S/N (serial number) function permits you to enter  directly 
     the  serial number of the file you wish to retrieve.   After  entering 
     the  serial  number,  press  ENTER and the computer  will  search  the 
     specified  directory path to locate the file for that  serial  number.
     The  F8  function  key is used to GET the selected file  as  described 
     below.

F8 - The  GET SELECTED function is used to GET the archive file highlighted 
     on the screen.   After the file is retrieved, the computer will return 
     to the GET/SAVE menu.

P

ARCHIVE PATH                                                           3301

Enter  the  directory path where the archive file is to  be  located.   

The  default archive path will always be the specified default  path   from 
the SETUP Menu (See MAIN MENU, F9).
 o73 
Please  refer to your computer owner's manual for a complete description of 
directories and path names.
.P

SERIAL NUMBER                                                          3302

Enter  the  serial  number of the codeplug archive file that  you  wish  to 
retrieve and press ENTER.  The computer will search the specified directory 
path  to  locate the file if it exists.   Only the specified path  will  be 
searched.

Once the  file  is located,  press F8 to GET the SELECTED file.   A  Status 
message will inform you if the file does not exist on the specified path.
.P

CLONE CODEPLUG                                                         3500

The Clone function copies the serial number and tuning data from an archive 
file and overlays this information over the current data in the  computer's 
memory.  To use the clone function use the following steps:

1.   Go to the GET/SAVE Screen.
2.   Load the Master radio or archive file into the computer  memory  with 
     the GET/SAVE screen functions F2 or F3.
3.   Press function F5 and the Clone File screen will be displayed. 
4.   Select the desired archive file to be cloned.  Only Radios of the same 
     model  may  be cloned.  Any attempt to mix models will  result  in  an 
     error message.
5.   If  necessary  go to the CHANGE/VIEW screens to  make  any  additional 
     changes.
.P

6.   Save the radio codeplug data by saving as an archive file or saving to 
     the radio to be cloned using the GET/SAVE screen.

This completes the procedure for cloning a archive file or radio.
.P

SAVE FILE                                                              3700

The SAVE FILE function is used to create (or update) an archive copy of the 
codeplug information onto a diskette or hard disk.  If you are creating the 
file  on  a hard disk,  you will automatically be instructed to backup  the 
data onto a diskette. 

An optional 15-character name can be given to an archive file to facilitate 
tracking.  

You  are  STRONGLY  encouraged  to  make an archive  copy  of  every  radio 
installed  or  serviced  in order to be able to  quickly  restore  customer 
information is case of a codeplug failure.  

P
SAVE FILE (cont)

Function Key Descriptions:

F2 - The  CHANGE  ARCHIVE function is used to specify  the  directory  path 
     where  the  archive file is to be located.   The default archive  path 
     will  always be the specified default path  from the SETUP  Menu  (See  o73 
     MAIN MENU, F9).

F8 - The  SAVE FILE function executes the save process.   Do NOT  press  F8 
     until you have entered the customer identification information.  



P

CUSTOMER ID                                                            3701

Enter  an  optional  15-character  (max)  name  for  the  archive  file  to 
facilitate tracking purposes. 
.P
BACKUP FILE                                                            3710

The BACKUP FILE procedure is used to make a backup copy of any archive file 
SAVED on a hard disk.   If you are archiving to a diskette, you will NOT be 
prompted  for a backup.  

Diskette  backups should be handled via standard DOS file copy  procedures.  
Refer to your computer user's manual for additional information.

Function Key Descriptions:

F2 - The CHANGE BACKUP path function is used to specify the directory  path 
     where the backup file is to be located.   The default backup path will 
     always  be  the specified default path  from the SETUP Menu (See  MAIN 
     MENU, F9).
.P
BACKUP FILE (cont)

F8 - The MAKE BACKUP function executes the backup process.  After verifying 
     that  the Backup Path is correct and the backup diskette is installed, 
     press F8 to make the backup copy.   You will automatically be returned 
     to the GET/SAVE menu.
.P

BACKUP PATH                                                            3711

Enter  the  directory path where the backup file is to  be  located.   

The default backup path will always be the specified default path  from the 
SETUP Menu (See MAIN MENU, F9).

Please  refer to your computer user's manual for a complete description  of 
directories and path names.
.P
CHANGE/VIEW                                                            4000

CHANGE/VIEW is a multi-level menu that is used to change,  view,  or modify 
codeplug features and option configurations.    All codeplug parameters are 
classified  as either RADIO-WIDE or CHANNEL related.   CHANGE/VIEW  permits 
access to each of these categories.

Unlike the SERVICE function, a codeplug must be loaded into your computer's 
memory  (via the GET/SAVE functions) before you can access the  CHANGE/VIEW 
screens.  You may CHANGE/VIEW an archive file without a radio connected.  

Warning:  CHANGE/VIEW does NOT actually modify the radio codeplug data, but 
          instead  it  modifies  a  copy of the  data  retrieved  from  the 
          codeplug (or archive file) via the GET/SAVE functions.
.P
CHANGE/VIEW (cont)
          After  all  CHANGE/VIEW modifications  are  completed,  you  MUST 
          return to the GET/SAVE menu and PROGRAM the changes back into the 
          radio  or  SAVE  them  to a  new  archive  file.   Otherwise  the 
          modifications will be lost when you turn off your computer. 

Function Key Descriptions:

F2 - RADIO-WIDE  Configuration is used to CHANGE/VIEW radio parameters  and 
     options that affect overall radio operation, i.e. those not related to  o73 
     a specific channel such as the time-out-timer. 

F5 - MODE Configuration is used to CHANGE/VIEW channel specific information 
     such as frequencies, squelch type, squelch codes and scan lists.
.P
CHANGE/VIEW (cont)

Function Key Descriptions:

F6 - PHONE MEMORY Configuration is used to program the Phone Memory Dialer
     (this menu option is ONLY available on phone capable models).

F7 - SIGNAL SYSTEM Configuration is used to CHANGE/VIEW Signalling System 
     parameters and options such as ID's, Pretimes, and Emergency operation.
.P
PRINT                                                                  5000

The  PRINT  function is  used to  produce  permanent  records  of  codeplug 
configurations  and/or  RF alignment settings.   A printer is required  and 
should  be  connected  to your computer per your  computer  user's  manual.
Graphics capability is NOT required.  

You  must use the GET/SAVE functions to first READ or GET a  codeplug   for 
printing  radio configuration data (see F2 below);  you must have  a  radio 
connected  to the computer for printing an alignment summary (see F5 below).

Each printout contains radio model and serial number information,  software 
version numbers,  Radio Service Software version numbers,  and the date and 
time of the printout.

P
PRINT (cont)

Function Key Descriptions:

F2 - RADIO  CONFIGURATION is a multi-level  menu  that  allows the  user to 
     print either the  Radio Wide Configuration, the  Mode Configuration or
     the full Mode Configuration.

F4 - The  PHONE LIST Summary  function  prints the  list of entries  in the
     phone  memory dialer  (only available on phone capable models).

F5 - The  ALIGNMENT  Summary  function prints the  current  relative  value 
     setting for all SERVICE alignment adjustments.

P
PRINT (cont)

Funtion Key Descriptions:

F6 - The  ARCHIVE  Files function prints a list of all  codeplug  files  by 
     serial number for a specified directory path.  

F7 - The  SIGNALLING LIST SUMMARY function prints a compressed  summary  of 
     all signalling systems that are programmed in the radio. 
.P

PRINT RADIO CONFIGURATION MENU                                         5200

This  PRINT submenu  provides various functions for printing radio wide and
mode configuration information.

F2 - The RADIO WIDE Configuration function  prints all the information from 
     the radio wide configuration screen.

F4 - The MODE Configuration (Summary) function prints a one page summary of
     the current mode configuration.

F5 - The  MODE Configuration (All Parameters) function prints all the info
     contained on the mode configuration screen for each mode.
.P
PRINT ARCHIVE FILES                                                    5600

This function will print a  list of the  archive files  which exist in  the
specified archive path.
.P
FILE MAINTENANCE                                                       6000

The  File Maintenance Menu is designed to help you manage your  files.   It 
can  be used to restore lost Archive Files from your Back-up Files,  create 
new Back-up Files, create directory paths, and delete Archive Files.

P
CREATE DIRECTORY PATH                                                  6400

This  screen  will  create  any  desired  directory  path  by  adding  sub-
directories that can be accepted by the DOS operating system.

Enter the new directory path and press the Enter key.

An Example directory path would be:

C:\MRSS\GP300\ARCHIVE\LOCAL <Enter>

This   would   add  the  sub-directory  "LOCAL"  under  the   sub-directory 
"ARCHIVE".  Only one sub-directory may be added at a time.

P

DELETE ARCHIVE FILE                                                    6600

The  Delete Archive File screen allows you to delete any Archive File  from 
the directory displayed in the Archive Path.

F3 - The CHANGE ARCHIVE function allows you to change the Archive Directory 
     Path.  Enter the new Path and Press Enter.

F5 - The  PRINT function print the serial numbers of the archived files  to 
     your printer.

F7 - The  DELETE  FILE function  will delete the file associated  with  the 
     highlighted  serial number.  You can move the highlight cursor to  the 
     desired  serial number by using the Tab and Enter keys.  Press  F7  to 
     delete  the file.  The Computer will ask you to confirm the delete  by 
     pressing F7 again.
.P

RESTORE ARCHIVE                                                        6700

This screen  is used to  restore lost  Archive Files from a  Back-up  Files 
Disk.

F3 - The  CHANGE SOURCE function is used to point to the Back-up  directory 
     Path.  Enter the new Path and press Enter.

F4 - The  CHANGE TARGET function is used to point to the Archive  directory 
     where  you  want to store the recovered Archive File.  Enter  the  new 
     Path and press Enter. 
.P
RESTORE ARCHIVE (cont)

F7 - The  RESTORE  FILE  function  is  used  to  move  the  Back-up   File, 
     highlighted  on the display, to the directory displayed on the  Target
     path.  You can move the highlight cursor to the desired serial  number
     by using the Tab and Enter keys.
.P

UPDATE BACK-UP FILES                                                   6800

The Update Back-up Files Screen allows you to create new back-up copies  of 
your archive files.

F3 - The  CHANGE SOURCE function is used to point to the Archive  directory 
     Path that you want to back-up.   Enter the new  Path and  press Enter.

F4 - The  CHANGE TARGET function is used to point to the Back-up  directory 
     where  you  want to store the Back-up Files.  Enter the new  Path  and 
     press Enter. 

F7 - The  CREATE  BACKUP  function  will  copy  the selected  Archive  File 
     contained in the Source Path to the directory of the Target Path.
.P
SETUP                                                                  9000

The  SETUP  functions are used to configure your Radio Service Software  to 
your particular application and computer environment. 

Function Key Descriptions:

F3 - PC  CONFIGURATION is used to set default disk drive paths for  Archive 
     files and Backup files.   It is also used to select which Asynchronous 
     Communications  Port  (COM 1 or COM 2) the RIB (Radio  Interface  Box) 
     will be connected to.

     Please   refer  to  your  computer  owner's  manual  for  a   complete 
     description of path names and Asynchronous Communication Ports.

P
SETUP (cont)

Note:  Your  Radio  Service Software will automatically determine  at  what 
       clock  speed  your  computer  is  operating.    No   user-selectable 
       parameters are required.

F7 - SCREEN  COLORS  is  used  to enable the  Color  display  option.   The 
     standard  default  configuration for Radio Service Software is  for  a 
     MONOCHROME display monitor.   However, if you have a color system, the 
     display quality will be greatly enhanced by enabling the color option.  

P

CONFIGURE COMPUTER                                                     9300

PC  CONFIGURATION is used to set default disk drive paths for Archive files 
and  Backup  files.    It  is  also  used  to  select  which   Asynchronous 
Communications  Port (COM 1 or COM 2) the RIB (Radio Interface Box) will be 
connected to.

Please refer to your computer owner's manual for a complete description  of 
directory path names and Asynchronous Communication Ports.


.P
CONFIGURE COMPUTER (cont)

Function Key Descriptions:

F3 - COMM TEST is used to verify that your computer is set up properly  and 
     is able to READ and PROGRAM a radio codeplug properly.

     After  your  computer  and RIB are connected per  your  Radio  Service 
     Software  manual  and you have selected the appropriate  communication 
     port, turn on your radio and execute COMM TEST by pressing F3.  

     COMM  TEST will verify your system is functioning properly by  sending 
     commands  to  the  radio and checking for  the  proper  response.   No 
     codeplug changes will result from these commands.  An OK response will 
     be displayed in the Status Window if the system checks OK.

P
CONFIGURE COMPUTER (cont)

     Otherwise,  error  messages will be displayed,  and you should consult 
     your manual for proper corrective action. 

F8 - SAVE  is used to save the configuration information to a file on  your 
     program  disk.   Every time you use the Radio  Service  Software,  the 
     configuration  that  you  SAVED last will be  used.   At  anytime  the 
     configuration may be changed and SAVED.

F9 - RESET  DEFAULT  is  used to reset the parameters on this screen  to  a 
     default   value.    However,   RESET   DEFAULT  does  NOT   save   the 
     configuration.   If the default values are desired, you must save them 
     via the SAVE (F8) function.
.P

ARCHIVE DISK DRIVE PATH NAME                                           9301

Enter the DEFAULT directory path where archive files are to be located.  

The GET/SAVE SAVE FILE function will default to this path.  

Please  refer to your computer owner's manual for a complete description of 
directories and path names.
.P

BACKUP DISK DRIVE PATH NAME                                            9302

Enter the DEFAULT directory path where backup files are to be located.  

The  GET/SAVE  BACKUP FILE function will default to this path  when  making 
backup  copies  of  codeplug  files archived to a hard  disk.  If  you  are 
archiving to a diskette, you will not be prompted for a backup. 

Diskette  backups should be handled via standard DOS file copy  procedures.  
Refer  to your computer user's manual for additional information  regarding 
coping files, directories, and path names.
.P

SERIAL COMMUNICATIONS PORT (Default = COM 1)                           9303

Use  the UP/DOWN arrow keys to select to which Asynchronous  Communications 
Port (COM 1 or COM 2) your RIB (Radio Interface Box) is connected.  

If  you  are  not sure how your computer is configured or if you  have  two 
Asynchronous Communications Ports, first select COM 1 and use the COMM TEST 
(F3) function to communicate with a radio.  If the test fails, select COM 2 
and  repeat  COMM  TEST.   Be sure that all cables and power  supplies  are 
connected  per  the  instructions in your  Radio  Service  Software  User's 
manual.  

Please refer to your computer owner's manual for a complete description  of 
Asynchronous Communication Ports and how to configure them.
.P

CONFIGURE COMPUTER SCREEN                                              9700

SCREEN  COLORS  is used to select the type of display monitor that you  are 
using with your computer, i.e. MONOCHROME or COLOR.  

For  proper  color  operation,  you  must  have a  color  monitor  and  the 
appropriate color display interface card installed in you computer.  Please 
refer  to  your computer owner's manual and/or your computer dealer if  you 
have questions regarding the color capability of your computer.

You  may  also further customize your screen by selecting  colors  for  the 
screen TEXT,  STATUS LINE,  MESSAGE LINE,  TEXT HIGHLIGHT,  BACKGROUND, and 
SCREEN OUTLINE.

P
Function Key Descriptions:

F8 - SAVE  is used to save the configuration information to a file on  your 
     program  disk.   Every  time you use the Radio Service  Software,  the 
     configuration  that  you  SAVED last will be  used.   At  anytime  the 
     configuration may be changed and SAVED.

F9 - RESET  DEFAULT  is  used to reset the parameters on this screen  to  a 
     default   value.    However,   RESET   DEFAULT  does  NOT   save   the 
     configuration.   If the default values are desired, you must save them 
     via the SAVE (F8) function.
.P

MONITOR TYPE (Default = Mono)                                          9701

Use  the UP/DOWN arrow keys to select either a MONOCHROME or COLOR  display 
monitor.

Screen configuration changes must be SAVED (F8) before you EXIT (F10)  this 
screen.
.P

TEXT (Default = Yellow)                                                9702

Use the UP/DOWN arrow keys to select the desired color for screen TEXT.  

Screen configuration changes must be SAVED (F8) before you EXIT (F10)  this 
screen.
.P




STATUS LINE (Default = White)                                          9703

Use  the UP/DOWN arrow keys to select the desired color for the STATUS LINE 
located in the lower portion of the top right-side window.

Screen configuration changes must be SAVED (F8) before you EXIT (F10)  this 
screen.
.P

MESSAGE LINE (Default = White)                                         9704

Use the UP/DOWN arrow keys to select the desired color for the MESSAGE LINE 
located in the upper portion of the top right-side window.

Screen configuration changes must be SAVED (F8) before you EXIT (F10)  this 
screen.
.P

HIGHLIGHT (Default = White)                                            9705

Use the UP/DOWN arrow keys to select the desired color for the  HIGHLIGHTED 
screen text.

Screen configuration changes must be SAVED (F8) before you EXIT (F10)  this 
screen.
.P

BACKGROUND (Default = Blue)                                            9706

Use  the  UP/DOWN  arrow keys to select the desired color  for  the  screen 
BACKGROUND.

Screen configuration changes must be SAVED (F8) before you EXIT (F10)  this 
screen.
.P

SCREEN OUTLINE (Default = Lt Red)                                      9707

Use  the  UP/DOWN  arrow  keys to select the desired color  of  the  screen 
OUTLINE.  

Screen configuration changes must be SAVED (F8) before you EXIT (F10)  this 
screen.
.P
CHANGE/VIEW RADIO-WIDE CONFIGURATION                                   4200

RADIO-WIDE  Configuration  is  used to  CHANGE/VIEW  radio  parameters  and 
options that affect overall radio operation, i.e. those not just related to 
a specific channel such as the time-out-timer. 

Warning:  CHANGE/VIEW does NOT actually modify the radio codeplug data, but 
          instead  it  modifies  a  copy of the  data  retrieved  from  the 
          codeplug (or archive file) via the GET/SAVE functions.

          After  all  CHANGE/VIEW modifications  are  completed,  you  MUST 
          return to the GET/SAVE menu and PROGRAM the changes back into the 
          radio  or  SAVE  them  to a  new  archive  file.   Otherwise  the 
          modifications will be lost when you turn off your computer. 
.P


VOX SENSITIVITY                                                        4201

This is normally a factory adjustment and does not need to be changed.  If,
however, you wish to decrease the VOX Sensitivity (make it open for louder
sounds), then increase the value here.

P

ACCESSORIES                                                            4202

You  may  choose to have your accessory connectory behave in one  of  three 
ways,  "auto  sense",  "headset only",  or "speaker mic only". "Auto Sense" 
will sample the microphone jack each time the radio is turned on.  If a PTT 
input  is  sensed,  then  the  radio will assume that the  accessory  is  a 
headset.  All subsequent external PTT inputs will be ignored.  If no PTT is 
sensed  when  the radio  is  first turned  on,  then the  accessory  is 
assumed to have it's own PTT switch,  for example a speaker microphone.  If 
you  choose "headset only",  then the radio will assume that it can  ignore 
all  external PTT inputs.  Thus,  only a  headset  or earpiece can be  used 
with the radio.  Speaker microphones  will  not function if this choice  is 
selected.  If  you  choose "speaker mic only",  then the radio  will  allow 
channel  changing  without disabling the external PTT when PTT is  pressed. 
Use for emergency critical operations.
.P

TIME-OUT-TIMER (TOT)                                                   4203

If Enabled, the TOT will limit the maximum time allowed for any  continuous 
transmission  to  60  seconds on all   transmit   channels.    Receive 
operation is not affected by the TOT.

Use  the UP/DOWN arrow keys to select either "OFF" or 60 seconds. 
.P
CONTROL BUTTONS                                                        4204

There are two buttons on the front of the radio.  The button on the left is 
the OPT Button and is labelled "OPT". The button on the right is the MON 
Button and is labelled "MON".  On radios equipped with a keypad there is 
an  extra button located inbetween the OPT and MON Buttons and is  labelled 
"MEM". Each button may be programmed to have a specific function.

The  choices for the OPT Button are Power,  Scan/Nuis Del (available  for 
scan models only),  Squelch, and None. The default for this button is Power 
for  radios  not  capable of scan and Scan/Nuis Del for radios  capable  of 
scan.  
.P
CONTROL BUTTONS (cont)

The choices for the MON Button are Mon/Vol Set and None. The default for 
this button is Mon/Vol Set. 

For radios with EARLIER versions of software, the default for the MEM 
Button is Memory and the choices are  Memory and None. For radios with 
LATER versions of software, the default for this button is Mem/Mem Prog
and the choices are Mem/Mem Prog, Memory, and None. 
.P

ALERT TONES                                                            4206

This field determines  if  alert tones are enabled or disabled.   The alert
tones affected by this field  are Power Up,  PTT Sidetone,  Time Out Timer, 
Busy  Channel,  Talk Prohibit,  Low Battery Alert,  Scan Talk  Back,   Scan 
Activate, Codeplug Failure and Good/Bad Key Chirp.  
.P

LIGHTS                                                                 4207

This field  determines if indicated lights are  enabled or  disabled.   The
lights affected  by this  field are  Busy Channel, Tramsmit, Monitor, Scan,
and Low Battery.

P

CHANNEL BUSY LIGHT                                                     4208

This field determines if the Channel Busy Light is enabled or disabled.  

Some reasons why you may which to disable the Channel Busy Light are:

  1. User could confuse the indicator with the low battery transmit light.
  2. Increases current drain on heavily used community repeater channels.
  3. Extraneous information if channel is carrier squelch.
  4. Extraneous information if Busy Channel Lockout is used.

P

LOW BATTERY                                                            4209

This field  determines the type of  Low Battery alert.   The radio can give 
several different type of feedback to the operator when  the battery is low
and  needs  to be  recharged.   There  are choices of  no  feedback  (NONE), 
flashing transmit light when keyed (LIGHT), and an audible tone in receive/
flashing transmit light when keyed (LGHT/TONE).  

The Tones fields influence what choices are available for this field.

The rules are as follows:

     TONES        LOW BATTERY
     all on       lght/tone, off
     all off      light, off
.P
FORCED MONITOR                                                         4210

This  field determines  if  Forced Monitor is enabled  or  disabled.   When
enabled,  this feature froces the radio  to  be  in  monitor  (PL disabled)
before  the radio can be keyed.   The operator will hear a low pitched tone
if PTT is pressed when not in monitor and the monitor light will illuminate.
Pressing the radio a second time will cause the radio to key.

Note:  We DO NOT recommand using this feature in combination with VOX,
       Busy Channel Lock Out or TX Inhibit
.P
TIME-OUT-TIMER (TOT) REKEY TIME                                        4211

If enabled, this will be the amount of time that needs to eplapse from  the 
expiration of the time-out-timer (tot) until a retransmition can occur.  If 
no elapsed time is needed or necessary, then disable this function.
.P
POWER-UP MODE                                                          4220

This  feature determines what mode the radio will be in upon  power-up.  To 
place  the receiver in CSQ,  overriding receiver PL and signalling,  choose 
"Monitor".  To  force  the  receiver to determine what form  of  continuous 
subaudible  code  (along  with carrier) is needed to  open  receive  audio, 
choose "Standard". 
.P
SCAN HANG TIME                                                         4523

This field  sets the  length of  time that  the radio  will  remain  on the 
channel  after receiving the  end of a transmission.   The hang time should
be as short as necessary  to maintain  message continuity.   The default is
2.5 seconds  and  the values can  range  from 200 ms to 4.2 s. 

During the hang time, the radio remains on the last active channel.  
.P

SCAN TALK BACK                                                         4525

The conventional channel scan has the capability to revert to the home mode 
(home  revert) or stay on the busy channel (talk back) when transmitting. 
These  capabilities  are now  programmable from  Radio  Service   Software. 
The  default is  home  revert.    To  change capabilities  use the  up  and 
down  arrow keys to select "N" for home  revert scan and "Y" for talk  back 
scan.
.P
         
CHANGE/VIEW MODE CONFIGURATION                                         4500

MODE Configuration is used to CHANGE/VIEW channel specific information such 
as frequencies, squelch type, squelch codes, and scan lists.

Warning:  CHANGE/VIEW does NOT actually modify the radio codeplug data, but 
          instead  it  modifies  a  copy of the  data  retrieved  from  the 
          codeplug (or archive file) via the GET/SAVE functions.

          After  all  CHANGE/VIEW modifications  are  completed,  you  MUST 
          return to the GET/SAVE menu and PROGRAM the changes back into the 
          radio  or  SAVE  them  to a  new  archive  file.   Otherwise  the 
          modifications will be lost when you turn off your computer. 
.P

NAME                                                                   4501

This field allows the user to indicate  mode placement.   The mode name can
be any value  between  01 and the maximum number of  channels  available in
the radio.

The radio will come defaulted from the factory with  a few test channels in 
the first  positions of  the rotary  switch.  You  may "fill" unused rotary 
positions by this field.  Naming more than one mode with the same name will 
cause the two  positions to be "strapped together."    Refer  to the  Radio 
Service Software  manual's section on  Mode  Placement Choices for  further 
information and examples.

P

TYPE                                                                   4502

This field indicates the mode type.  The available types are conventional
and scan.
.P

RECEIVE FREQUENCY                                                      4503

Enter  the RECEIVE frequency directly in MHz.   

Blank RECEIVE frequencies are NOT allowed.

Refer  to the MOTOROLA Catalog Sheets / Price Pages or your Service  Manual 
for valid RECEIVE frequencies for this model.
.P

TRANSMIT FREQUENCY                                                     4504

Enter  the TRANSMIT frequency directly in MHz.

For a "Receive-Only" channel,  enter a B.   The TRANSMIT frequency will  be 
displayed as BLANK.

Refer  to the MOTOROLA Catalog Sheets / Price Pages or your Service  Manual 
for valid TRANSMIT frequencies for this model.
.P

SQUELCH TYPE                                                           4507

Use  the UP/DOWN arrow keys to select the SQUELCH type:

     CSQ - Carrier Squelch
     TPL - Private Line
     DPL - Digital Private Line
     INV.DPL - Inverse DPL

Data  fields  for transmit and receive codes will be displayed for  PL  and 
DPL.


.P

PL SQUELCH CODE                                                        4508

Enter  the  PL  frequency  directly in  Hz  (Ex:   192.8),   or  enter  the 
alphanumeric code (Ex:  7A).

Enter a B for Carrier Squelch operation.

Valid codes may also be selected via the UP/DOWN arrow keys.

Standard PL frequencies are listed on the next page:

P
PL SQUELCH CODE (cont)

Standard Private Line Frequencies / MOTOROLA Code:

Freq  Code    Freq  Code     Freq  Code     Freq  Code     Freq  Code     
67.0   XZ     91.5   ZZ      123.0  3Z      167.9  6Z      225.7  M4
69.3   WZ     94.8   ZA      127.3  3A      173.8  6A      229.1  9Z
71.9   XA     97.4   ZB      131.8  3B      179.9  6B      233.6  M5
74.4   WA     100.0  1Z      136.5  4Z      186.2  7Z      241.8  M6
77.0   XB     103.5  1A      141.3  4A      192.8  7A      250.3  M7
79.7   WB     107.2  1B      146.2  4B      203.5  M1      254.1  OZ
82.5   YZ     110.9  2Z      151.4  5Z      206.5  8Z
85.4   YA     114.8  2A      156.7  5A      210.7  M2
88.5   YB     118.8  2B      162.2  5B      218.1  M3
.P

DPL SQUELCH CODE                                                       4509
Enter  the  DPL  code  directly (Ex:  031);  note that  leading  zeros  are 
required.  

Enter a B for Carrier Squelch operation.

Valid codes may also be selected via the UP/DOWN arrow keys.

Valid DPL codes are listed on the next page:

P
DPL SQUELCH CODE (cont)

Valid DPL Codes:

Code   Code    Code    Code    Code    Code    Code    Code    Code
023    071     134     223     306     411     503     631     734 
025    072     143     226     311     412     506     632     743 
026    073     152     243     315     413     516     654     754    
031    074     155     244     331     423     532     662         
032    114     156     245     343     431     546     664         
043    115     162     251     346     432     565     703         
047    116     165     261     351     445     606     712         
051    125     172     263     364     464     612     723         
054    131     174     265     365     465     624     731         
065    132     205     271     371     466     627     732
.P

RX Signalling System                                                   4510

Enter the number of the Signalling System that is desired for the  receiver 
of  this  mode. Signalling Systems are set-up under the  Signalling  System 
Configuration Screen.  

If there is no Signalling System for this mode enter "00". The only types of
systems that you may assign are Quik-CAll II Advantage (QCII) and Generic
Advantage (Generic).  

You may have only ONE signalling system per mode. This means that if you have
a Rx Signalling System, then you may NOT have a Tx Signalling System AND the 
.P
RX Signalling System (cont)

Simple Option Board field is automatically DISABLED and NOT available.

If the Tx Signalling System is of type DTMF, then you may also assign a Rx
Signalling System but NOT a Simple Option Board. 
.P

TX Signalling System                                                   4511

Enter  the  number  of  the  Signalling  System that  is  desired  for  the 
transmitter of this mode. Signalling Systems are set-up under the  
Signalling System Configuration Screen.  

If there is no Signalling System for this mode enter "00". The only types of
systems that you may assign are DTMF (DTMF) and Generic Advantage (Generic).  

You may have only ONE signalling system per mode. This means that if you have
a Tx Signalling System, then you may NOT have a Rx Signalling System AND the 
.P
TX Signalling System (cont)

Simple Option Board field is automatically DISABLED and NOT available.

If the Tx Signalling System is of type DTMF, then you may also assign a Rx
Signalling System but NOT a Simple Option Board.
.P


BUSY CHANNEL LOCKOUT                                                   4512

Busy  Channel Lockout may be enabled by choosing "Y".  When enabled,  the 
radio will be 'polite' to other users on the channel.  In other words,  the 
radio will not let you hear conversations of other users and will not allow 
you  to transmit on top of another user.  The only calls you will hear  are 
those  with  your PL code,  even if you press  the  monitor 
button.  If  you  press PTT on the radio while there is a  carrier  on  the 
channel, the radio follows this protocol:

          a. If the carrier has your PL, then you are allowed to transmit
             just like normal.
.P
          b. If the carrier has no PL or the wrong PL, then you will hear
             a  busy  tone while you hold PTT.  Release PTT and  try  again
             later.

If you choose "N", then the radio will transmit and receive like a normal 
two-way radio.     
.P


VOX                                                                    4513

This field determines if the Voice Operated Transmission is enabled or
disabled.  If enabled, VOX requires an accessory headset that has a Mic
audio live at all times.  

The radio will sense the presence of the headset each time the radio is 
turned on.  You may, therefore, defeat VOX by removing the headset and 
cycling the power switch.

When channel scan is enabled, the radio's software must decide as to which
way VOX will behave.  This decision will supercede all other mode 
specifications regarding VOX.
.P
BATTERY SAVER                                                          4514

This field sets the rate of the Battery Saver feature.  The possible choices
for this field are Short, Medium, Long or Off.  

The following is a summary of characteristics for the three rates:

    RATE      RX On Time    Sleep Time     Improved Capacity

    Short      50 ms           50 ms             8%
    Medium     50 ms          150 ms            15%
    Long       50 ms          250 ms            20%
 
.P
POWER                                                                  4515

This field sets the  power level.   The choices are high power (4 or 5 W), 
or  low power (2 W).  Your  radio is  calibrated at the factory for each of 
these  power   levels.    Your  particular   model  may  be  calibrated  to 
different  power levels due to local regulatory requirements  Consult  your 
Service Manual for more information.  
.P
SIMPLE OPTION BOARD                                                    4516

Configures the radio to use a simple type option board and enables the
option board on the current mode.

Enabling (set to "Enable") allows the useage of third party boards such as 
scamblers.

You may have only ONE signalling system per mode. This means that is you have
the Simple Option Board field ENABLED, then you may NOT have a Rx Signalling
System, AND you may NOT have a Tx Signalling System. 

If the Tx Signalling System is of type DTMF, then you may also assign a 
Simple Option Board but NOT a Rx Signalling System.
.P
SCAN LIST NUMBER                                                       4521

This  field indicates  the number of the  scan list that is  assigned to be
used with this mode.

P

PRIORITY SAMPLING RATE                                                 4522

When the channel scan is stopped on a non-priority channel, it periodically 
"looks back" at the priority channel for activity.  The rate at which  this 
"look  back"  occurs  is  the priority sample  rate.   The  are  two  rates 
available,  slow  and fast.  Slow is 1.5 seconds between "look  backs"  and 
Fast is 0.5 seconds between "look backs".  Slow is the default.  To  change 
the sample rate use the up and down arrow keys to select the rate.

Note : Earlier radio software versions do not support this feature! 
.P

HOME REVERT MODE                                                       4524

This field sets the Home Revert Mode for this channel.  

If  the TalkBack  feature is  enabled, then  the  radio  will act  in the 
following  manner.  If you hear activity on  a mode, then  the radio will 
stop on this active mode until the  hang timer expires.  During this hang 
time any transmission will occur on this active mode.  In all other cases, 
the radio will revert to the Home Mode.  

If  TalkBack is  disabled,   then the  radio  will always  revert  to the 
preprogrammed Homd Mode for transmissions,   regardless  of hang time.
.P
HOME REVERT MODE (cont)

The  scan will  default with TalkBack enabled when a scan list is created.

The Home Revert Mode  can be specified as any conventional channel in the 
radio.  A good practice  is to  leave this set at the default priority 1.
.P

ACTIVE CHANNEL TONE                                                    4526

This field will determine if the Active Channel Tone is enabled or disabled.
If enabled, Active Channel  Tone will allow the  user to rotate the channel
selector to  find  the last active  channel.   When the channel is found, a
single tone  will  be heard.   The tone  will remain  associated with  that 
channel until the radio is powered off/on, or the PTT is pressed.
.P

PRIORITY CHANNEL TONE                                                  4527

This field  determines if the Priority Channel Tone is enabled or disabled.
If enabled, a tone will be produced whenever the  radio scans to  and stops
on a priority channel.  This alerts the operator that a priority message is
being  listened to.  It is suggested that this tone be turned off if there 
is heavy use of RapidCall calling features on the priority channel.
.P

SCAN ACTIVATE TONE                                                     4528

This field determines if the Scan Activate Tone is enabled or disabled.  If
enabled, a tone will be  produced when the rotary  selector  is turned to a
scan list  position.  This is helpful to the user when the radio is worn on
a belt.
.P

PHONE SIGNALLING SYSTEM                                                4529

Enter the number of the Signalling System that is desired for use when
performing phone dialing operations on this mode.
.P
TX INHIBIT                                                             4530

This feature is only available when the channel has a CSQ receive code.  
When enabled, this feature will not allow the radio to transmit while a
carrier is present on the channel.  A busy tone will be heard in such a case.
.P
MODE SLAVED SCAN LIST                                                  4561

This  screen displays the available modes and their scan TYPE for the  mode 
display in the upper left side of the display.  The scan types are  changed 
by  moving  the cursor with the Enter or Tab keys to the desired  Mode  and 
changing its TYPE by using the up and down arrow keys.  Note that  Priority 
One  is  always  the Mode that the current scan list is  slaved  to.   This 
priority cannot be changed.  

Function Key Descriptions:

F2 -  GO TO MODE allows you to go to the Mode Slaved Scan List you want  to 
      modify  without  returning  to  the  MODE  CONFIGURATION  screen  and 
      stepping through the modes in-between.  

P
MODE SLAVED SCAN LIST (cont)

F3 & F4  - NEXT MODE will advance the screen to the next Mode  Slaved  Scan 
      List.  If you are at the last Mode in the radio then pressing F4 will 
      take  you to Mode 1.  PREVIOUS MODE will return you to  the  previous 
      Mode.   If you are at Mode 1, pressing F3 will take you to  the  last 
      Mode in the Radio.

F5 -  PRINT SCREEN will send the currently displayed Mode Slaved Scan  List 
      to the printer.

F7 -  ERASE LIST will remove all of the Modes from the current scan list.
.P
 
MODE UTILITY                                                           4580

The  MODE  UTILITY  screen is used for  adding,  deleting,  or  moving  the 
location  (order)  of  Conventional  modes.    Modes  may  also  be  copied 
(duplicated), including scan lists (Mode-Slaved only).

The  F8  (EXECUTE)  function key is used to execute the  changes  once  all 
information has been entered.

The  GET/SAVE functions must be used to program the changes into the radio, 
as is required for all CHANGE/VIEW modifications.
.P

UTILITY (Default = Add Mode)                                           4581

Use  the  UP/DOWN arrow keys to select the desired UTILITY  function:   Add 
Mode, Copy Mode, Delete Mode, or Move Mode.

The  F8  (EXECUTE)  function key is used to execute the  changes  once  all 
information has been entered.

The  GET/SAVE functions must be used to program the changes into the radio, 
as is required for all CHANGE/VIEW modifications.
.P

MODE TYPE                                                              4582

Mode Type is Conventional and cannot be changed.
.P

INSERT AFTER MODE                                                      4583

Enter the mode number that the mode is to be INSERTED AFTER.

After entering this number and pressing Enter,  the mode name for that mode 
will  be  displayed.   Use  the name to verify that the proper  number  was 
entered.
.P

NEW MODE NAME                                                          4584

Enter the 8-character alpha-numeric MODE NAME.   The Mode Name will default 
to "Mode nn", where nn = mode number.  If Mode Names are disabled, you will 
not be able to change this field. 

Each  mode  may be assigned a Name to facilitate ease  of  operation.   The 
[Mode] rocker button is used to scroll forward or backward through the list 
of modes programmed in the radio.

Since  the mode number is required for direct keypad mode selection via the 
[Home] button for keypad models,  using the mode number as part of the mode 
name is desirable, but not required.
.P

MODE TO COPY FROM                                                      4585

Enter the Mode Number TO COPY FROM.  Any valid conventional mode number may 
be entered.

After entering this number and pressing Enter,  the mode name for that mode 
will  be  displayed.   Use  the name to verify that the proper  number  was 
entered.

Frequencies  (Rx,  Tx,  T/A),  squelch type,  squelch codes,  and all  mode 
options  will  be copied.   You may choose to copy the  channel  scan  list 
(mode-slaved  only)  or  to enter a new one.

This  field is required for the Copy Mode function;  it is optional for the 
Add Mode function.
.P

COPY SCAN LIST (Default = N)                                           4586

Use the UP/DOWN arrow keys to select Y to copy the channel scan list (mode-
slaved only) or N for a blank list.

If  the  copied  list  is full (16 modes),  the new mode  will  assume  the 
priority of the copied mode and the copied mode will not be part of the new 
list. 

Otherwise,  the new mode will assume the priority of the copied  mode,  and 
the copied mode will be a non-priority mode on the new list.
.P

MODE TO COPY TO (Default = Blank)                                      4587

Enter  the Mode Number TO COPY TO.

After entering this number and pressing Enter,  the mode name for that mode 
will  be  displayed.   Use  the name to verify that the proper  number  was 
entered.

Frequencies  (Rx,  Tx,  T/A),  squelch type,  squelch codes,  and all  mode 
options  will  be copied.   


.P

MODE TO DELETE                                                         4588

Enter the Mode Number TO DELETE.  

After entering this number and pressing Enter,  the mode name for that mode 
will  be  displayed.   Use  the name to verify that the proper  number  was 
entered.

CAUTION:  After  the F8 (EXECUTE) function key has been pressed,  the  mode 
          will be deleted and may not be recovered.  However, if you make a 
          mistake  AND the data has not been programmed or saved  (GET/SAVE 
          functions), you may re-read the codeplug or original archive file 
          and start over.
.P

MODE TO MOVE                                                           4589

Enter  the  Mode Number TO MOVE.   Any valid conventional mode  number  may 
moved.  

After entering this number and pressing Enter,  the mode name for that mode 
will  be  displayed.   Use  the name to verify that the proper  number  was 
entered.


The mode and all the releated parameters will be moved to the new position.


.P
PHONE MEMORY DIALER                                                    4600

This screen allows the user to create a list of phone numbers.  Up to nine
16-digit phone numbers can be entered on this screen.

P
SYSTEM                                                                 4700

This  screen  allows  you to  configure one  or  more  signalling  systems.  
These  signalling systems will be used by the Call List and Mode screens to 
determine when and where decode or encode.
.P

TYPE                                                                   4702

When this screen is displayed the cursor is placed on the TYPE data  field.  
The  available  system  types  are None,  MDC1200,   QCII (QUIK CALL), DTMF
and DTMF/PHONE  (only  on phone capable radios).    On  Limited Signalling
models the available  system  types are  None, MDC1200-PTTID,  MDC1200-DOS,
QCII and DTMF/PHONE (only on phone  capable radios).  The system types  are
selected  by  using the Up/Down arrow keys.    None implies that all of the
signalling  systems in the radio are  deactivated.
.P

ID                                                                     4703

MDC-1200 :
  MDC-1200 requires that each radio have a unique four digit ID number.The 
  default is the last four digits of the radio serial number.  The range is 
  from  0001 to DDDD.   Four zeros will show up as "NONE";  this is useful 
  when you desire the radio to "listen only". An example of a "listen only" 
  situation  might  be  a  volunteer fireman  monitoring  a  fire  dispatch 
  channel. 

MDC-1200 PTTID:
  MDC-1200 PTTID requires that the radio have an ID number.  This number 
  should be unique to the radio's system.  The ID follows the same rules as
  MDC-1200 ID, except that NONE is not allowed.
.P
DTMF :
  DTMF  requires each radio to have a unique 1 to 8 digit ID  number.   The
  default is the last four digits of the radio serial number.   Digits 0 to
  9, *, and # may be used.  Any unused digits may be filled in with a  '-'
  character.

QCII :
  QCII ID corresponds to tones A and B.   It requires  at two unique tones.
  The defaults are 358.6 Hz (tone A) and  903.s Hz (tone B).   The range is 
  from 304.0 to 2470.0 Hz.  Don't be alarmed if the frequency that you type
  in changes by a few Hertz. This change can occur because the program must 
  calculate  the nearest  frequency that  the radio  can  understand.   You 
  will find that the error  will always be  within the acceptable  industry 
  bandwidth.
.P


GROUP ID                                                               4704

The  MDC1200 ID is a three hex digit number common to a group  of  radios 
and ranges from 000 to EEE.




.P

CALL FORMAT                                                            4705

This field is currently forced to be A-B/Long B.  Long B cannot be disabled.
.P

CALL TYPE                                                              4706

There are three different choices for this field.  The Up/Down arrow keys 
will scroll through the following choices :  Call Alert,  Call Alert/Voice, 
and  Voice  Selcall.   Call Alert leaves call indication at  the  receiving 
radio.    Call  Alert/Voice  leaves  a  call  indication  and  unmutes  the 
loudspeaker  of the receiving radio.   Voice Selcall unmutes loudspeaker on 
receiving radio but does not leave any call indication.  MDC-1200 does  not 
allow Voice Selcall call type since Voice Selcall is an inherent feature of 
all MDC-1200 signalling systems.
.P

PL/DPL REQUIRED                                                        4707

The Up/Down arrow keys will allow the choices of either "Y" or "N".   "Y" 
implies the correct PL/DPL is required to recieve data.  "N" implies PL/DPL 
is  not  required  to receive data.  In most systems you  may  choose  "N", 
however,  when  you  share  a channel with other users who  have  the  same 
signalling type then you should choose "Y". Choosing "Y" on shared channels 
will ensure that you don't accidentally receive a call which is directed to 
another user. 

Note :  Some existing DTMF and Quik Call systems require PL stripping, and 
therefore it is recommended that an "N" be chosen in these cases. 
.P

ALERT TONE RESET                                                       4708

Alert Tone Reset only applies if the Call Type is CALL ALERT or CALL ALERT
W/VOICE.  This determines how the audible alert tone will be reset.  The
choice of AUTOMATIC means that the alert tone will be automatically reset
for you.  The choice of MANUAL means that there will be repeating alert
tones every 10 seconds that must be manually reset by pressing any button.
.P

CONVERSATION RESET                                                     4709

Conversation Reset only applies to a Call Type of CALL ALERT W/VOICE.  When
a call alert is received you may wish the radio remain in CSQ operation for
a follow-up voice message or so that you may hold a brief conversation.  At 
the end of the conversation, you may also want the radio to return to its
previous squelch condition.  If you choose MANUAL RESET, then the radio 
will reset the squelch condition immediately after the operator presses the
monitor button.  If the choice of AUTO RESET is selected, then the radio 
will wait for seven seconds after a carrier loss and/or radio transmission
before resetting the squelch condition.
.P

ACK PRETIME                                                            4711

  Systems   that  use Call Alert require that the radio  acknowledge  (ACK)  
that the  Call Alert has been received.  ACK Pretime is the delay from when  
the  radio  receives  a  Call Alert to when it starts  the  ACK   sequence.   
The default ACK pretime is 0.5 seconds.  If a different pretime is required  o73 
for your  system move the cursor to the ACK Pretime data field and   change  
the time  using  the up and down arrow keys.  The range can be from 0.2  to  
2.0 seconds in 0.1 second steps.
.P

SIGNALLING SQUELCH                                                     4714

  This  feature can either be enabled "Y" or disabled "N" using the Up/Down 
arrow  keys.  If this feature is enabled "Y",  then one of the control but
tons  can  be used to put the radio into  signalling  squelch.   If  this 
feature  is  disabled "N",  then signalling squelch is not  activated.  The 
default is "N".

  Signalling  Squelch is similar to Private Line.  When enabled,  the radio 
will  only unmute for Call Alerts and Voice Selcalls.  Like  Private  Line, 
Signalling  Squelch  can  be  disabled by pressing the  monitor  button   
You   will   find  that Signalling Squelch is  automatically  ENABLED  when 
channel scan is on.    
.P

DOS HOLDOFF                                                            4715
  Data   Operated   Squelch  (DOS)  is  used with  data signalling  systems 
(such  as  MDC-1200)   to    mute    the  data  transmissions   to   reduce  
operator  annoyance.   DOS  attempts  to  mute  the  speaker  when data  is 
present  on  the channel.    DOS Holdoff keeps  the speaker muted   for   a  
preset period  of time from when carrier is  detected   by    the   squelch 
circuit.    This  allows the DOS time to detect any data  activity, further 
reducing the annoyance of data being heard from the speaker. 

  The  default  holdoff  is 0.5 seconds.    If a different holdoff time  is 
required  for   your system  move the cursor to the DOS Holdoff data  field 
and  change the   time using the Up/Down arrow keys.  The range can be from 
0.0   to  4.3  seconds  in  0.1 second  steps.     
.P


PTT ID                                                                 4716

  If you want your unit id to be sent on each Push-to-talk (PTT),  then set 
this field to "PRE", "POST", or "NONE".  "PRE" sends the id at the press of 
PTT.  "POST" sends the id upon release of PTT. If  you choose "NONE",  then 
the id will not be sent during PTT.     

P

PTT SIDETONE                                                           4717

  PTT   sidetones   are  used when PTT ID is  activated.    Sidetones   are  
heard  through the speaker when the operator first presses the  PTT.   They 
are  used  to  tell  the  operator   that he cannot  speak  until  the   ID  
has   been transmitted.  There are two sidetones available in the  Radius.  
The  PTT  ID Sidetone  is a continuous tone heard from PTT until the ID has  
been  sent.  The second tone, PTT Short Sidetone, is a short beep after the 
ID  has   been sent.    Both  tell  the operator when he is  permitted   to  
speak  into  the microphone.   One,  both  or no Sidetones maybe activated. 
They   can  be activated  by moving the cursor to the desired sidetone  and 
using the Up/Down arrow keys to choose either "Y" or "N" to either activate 
or deactivate the sidetones. 
 o73 
.P

PTT SHORT SIDETONE                                                     4718

  PTT   sidetones   are  used when PTT ID is  activated.    Sidetones   are  
heard  through the speaker when the operator first presses the  PTT.   They 
are  used to  tell  the  operator  that he cannot yet speak until  the   ID  
has   been transmitted.  There are two sidetones available in the  Radius.  
The PTT  ID Sidetone  is a continuous tone heard from PTT until the ID  has  
been  sent.  The second tone, PTT Short Sidetone, is a short beep after the 
ID  has   been sent.    Both  tell  the operator when he is  permitted   to  
speak  into  the microphone.   One,  both  or no Sidetones maybe activated. 
They   can  be activated  by moving the cursor to the desired sidetone  and 
using  the  Up/Down arrow keys to choose either "Y" or "N" to  activate  or 
deactivate the sidetones. 

P








PRETIME                                                                4719
  The    pretime    is  the  delay from the start  of  transmit  (when  the 
operator pushes PTT) to when  the data signalling begins.    This delay  is 
required   in  order  to  allow   the  radio    to   completely   open  the 
communications  path  through   repeaters  or  other   system   components.    
The  default   pretime   is 0.5 seconds.    If  a  different   pretime   is  
required  for your  system move the cursor  to  the Pretime data field  and 
change the  time using the Up/Down arrow keys.   The range can be from  0.1 
to 4.2 seconds in 0.1 second steps.

P




FIXED RETRY WAIT                                                       4720

  When  emergency  is  activated  by  the  operator  the  radio  expects an 
acknowledge from the base station.  If no acknowledge is received then  the 
radio   will repeat the emergency sequence after a delay.  The radio always 
waits a random time greater than twice the Pretime.  The additional time is 
the  Fixed Retry Wait time.  Fixed Retry Wait is the time the  radio  waits 
between emergency tries.  The default  is 0.0  seconds (STAR default is 8.1 
seconds).   If  a  different Wait Time is required move the cursor to   the 
Fixed  Retry  Wait data field and change the time using the  Up/Down  arrow 
keys.   The  range  can be from 0.0 seconds to 16.9 seconds in  0.4  second 
steps.
.P

TX TONE DURATION                                                       4723

  This is the length of each digit that is transmitted by the  radio.   The 
default  is 99 msec.   Use the Up/Down arrow keys to change the default 
value.  The range is 50.7 to 4296 msec.  in 16.5 msec. intervals. o73 
.P

TX TONE INTERVAL                                                       4724

  This is the time between the transmission of different DTMF digits.   The 
default  is 50.7 msec.   Use the Up/Down arrow keys to change the  default 
value.  The range is 50.7 to 4286 msec. in 16.5 msec. intervals.
.P
ACKNOWLEDGE                                                            4725

If Acknowledge is enabled, then the radio will transmit a transpond signal
when it receives the correct ID.
.P
ACCESS CODE                                                            4726

The Access Code is a string of up to 8 DTMF digits .  When DTMF/PHONE access
is assigned to a mode, the MEM * sequence will send this Access Code.
.P
DEACCESS CODE                                                          4727

The Deaccess Code is a string of up to 8 DTMF digits.  When DTMF/PHONE
access is assigned to a mode, the MEM # sequence will send this Deaccess
Code.
.P
SIDETONE                                                               4728

The Sidetone is a continuous tone heard from  PTT until the ID has been sent.

Sidetones are heard through the speaker when the Access and Deaccess Codes
are being transmitted.  They are used to tell the operator that he cannot 
yet speak until the ID has been transmitted.

P
SHORT SIDETONE                                                         4729

The Short Sidetone is a short beep after the ID has been sent.

Sidetones are heard through the speaker when the Access and Deaccess Codes
are being transmitted.  They are used to tell the operator that he cannot
yet speak until the ID has been transmitted.
.P
TX HOLD TIME                                                           4730

The Tx Hold Time determines how long the radio will remain keyed between
keypad presses.  This allows the transmitter to stay up when using the DTMF
keypad for "live" dialing.  The minimum value for this field is determined
by the values of Tx Tone Duration and Tx Tone Interval.  The Tx Hold Time
CANNOT be less than the sum of the two Tx Tone values.  The maximum value
for this field is 4.2 seconds and the default is 2.5 seconds.
.P
OVERRIDE BCL                                                           4731

This  will  determine  whether or not Busy Channel Lockout  (BCL)  will  be 
defeated  while in phone mode. If "Y", then BCL will be defeated  while  in 
phone mode. If "N", then BCL will not be defeated while in phone mode.
.P
