  AUTODIAL


  This option Enables/Disables the Automatic Dialing feature of the DTMF
  front cover option.  This feature allows automatic dialing of a phone
  number stored in any one of the 10 memory locations available.  These
  numbers can be entered by the MT1000 Radio Service Software or can be user
  programmed in the field.  If enabled, the * and # keys perform as dual
  function keys.  The * is used to perform Autodial and the # is used for
  Indefinite Pause.  If disabled, the * and # function only as the
  corresponding DTMF tone.
