  UNIT ID SIDETONES


  This option Enables/Disables the sidetones during Unit ID.  When enabled, a
  1640 Hz sidetone will be emitted during the pretime and data transmission
  to act as a reminder to the user that data is being transmitted and should
  not talk during this time.

