  CHANGE MENU


  The Change Menu allows you to access the PL Table (F2), the Quik Call II
  Table (F3), the Per-Radio Features (F5), the Per-Channel Features (F6),
  the Scan Features and List (F8), and the Bandsplit (F9) by pressing the
  corresponding function key.
