  RECEIVE FREQUENCY


  The Receive Frequency, in MHz, must be directly entered using the Numeric
  Keys, and it must be divisible by 5.0 KHz or 6.25 KHz.  The decimal places
  and trailing zeroes need not be entered.  If the Receive Frequency is left
  as None, the channel will not be valid.
