  TIME OUT TIMER


  This option sets the length of time, in seconds, for which the radio is
  allowed to transmit.  The Time Out Timer duration settings range from 1
  to 255 seconds. The Time Out Timer is Enabled/Disabled for a particular
  channel through the MAIN/CHANGE/PER-CHANNEL Screen (F6 in the MAIN/CHANGE
  Menu Screen).
