  QUIK CALL II TABLE


  The Quik Call II Table Screen allows the entry of two Quik Call frequency
  and code pairs.  You must use Quik Call II #1 before you use Quik Call
  II #2.

  FREQUENCY -  The Frequency is displayed in Hertz (Hz).  You may scroll
  through the frequencies by using the Up/Down Arrow Keys.  As the frequency
  is scrolled, so is the Motorola Code.  You may also enter the frequency
  directly by using the Numeric Keys.  The corresponding Motorola Code will
  be displayed, provided one exists.  The directly entered frequency, however
  may be slightly changed due to the resolution of the algorithm used to
  decode the quik call frequency in the radio.
                                                                <Page Down> 
.P
  MOTOROLA CODE - The Transmit Code may be scrolled through by using the
  Up/Down Arrow Keys.












                                                                  <Page Up> 
