  SCAN LIST


  The Scan Screen allows you to set up the channels to be scanned by the
  radio when in the scan mode.  The Scan Channel Number may be entered
  directly with the Numeric Keys or scrolled with the Up/Down Arrow Keys.
  You may program up to 6 channels to be scanned.  The Scan Channel Number
  may be 00 to 06. The 00 entry indicates a None.
