                                  OTHER HELP

                               Required Equipment

             1)  IBM Personal Computer
             2)  Radio Interface Box (RIB) - P/N 01-80353A74
             3)  Wall Mounted Power Supply - P/N 01-80357A57
             4)  Computer Interface Cable
                   P/N 30-80369B71 (25 pin)
                   P/N 30-80369B72 (9 pin)
             5)  Program/Test Cable - P/N RTK-4205A
             6)  P200LB Radio Service Software
                   HVN-9793  (5 1/4 in.)
                   HVN-9794  (3 1/2 in.)
             7)  Portable Products Test Set - P/N RTX-4005B
