  CHANNEL DEVIATION ALIGNMENT

  Channel Deviation Alignment screen allows you to set the Transmit Devia-
  tion and Reference Deviation values individually for any channel.  Follow
  the instructions in the Channel Deviation Alignment section of your P200
  Loband radio Service Manual.

  NOTE:  The Workspace must match the radio's Codeplug before any alignment
  is attempted, otherwise it will be invalid.  Therefore, the radio should
  have been either read or programmed immediately before the alignment is
  performed.



                                                                <Page Down> 
.P
  The program will update the corresponding values in the radio's RAM - not
  the EEPROM - to provide you with immediate feedback on the alignment.  The
  alignment values will be updated in the Workspace, but the radio's Codeplug
  must be programmed by pressing the F8 key for the alignment values to be-
  come permanent.  Any other parameters in the radio will remain intact when
  programming from this screen.  The deviation values will be updated in the
  radio along with all other parameters if the radio is programmed from the
  MAIN/GET-SAVE/PROGRAM RADIO screen.

  The Transmit Frequency for the channel number displayed on the screen is
  shown in the instructions/error messages box.  If the channel number at
  the channel prompt is changed, the Tx frequency will be taken from the
  Workspace and shown on the screen.

                                                  <Page Down>    <Page Up> 
.P
  CHANNEL - The number of the channel to be aligned may be entered with the
  Numeric Keys, or scrolled through with the Up/Down Arrow Keys.  Changing
  the channel number in the screen will cause the workspace frequency and
  alignment values to be resent to the radio's RAM.  The radio need not be
  on the same channel as the channel indicated on the screen during the
  alignment procedure.  The Radio Service Software will automatically up-
  date the radio's RAM with the Tx frequency shown.

  TRANSMIT DEVIATION - This feature adjusts the voice deviation level (300 -
  3000 Hz).  Values range from 0, for minimum deviation, to 31, for maximum
  deviation.  They may be changed using the Numeric Keys, or scrolled through
  using the Up/Down Arrow Keys.


                                                  <Page Down>    <Page Up> 
.P
  REFERENCE DEVIATION  - This feature adjusts the reference deviation levels
  (less than 50 Hz).  Values range from 0, for minimum deviation, to 15, for
  maximum deviation.  They may be changed using the Numeric Keys, or scrolled
  through using the Up/Down Arrow Keys.  A 30 Hz tone will be automatically
  generated when the radio is keyed while in this feature.

  F8 (PROGRAM VALUES) - To program the Transmit and Reference Deviation val-
  ues in the radio's Codeplug, press the F8 key.  Any other parameters will
  remain intact.





                                                                  <Page Up> 
