  SERVICE MENU

  The Service Menu allows you to access the screens to perform Squelch and
  Volume Alignment (F3), and Channel Deviation Alignment (F7) by pressing
  the corresponding function key.


  NOTE:  The Workspace must match the radio's Codeplug before any alignment
  is attempted, otherwise it will be invalid.  Therefore, the radio should
  have been either read or programmed immediately before the alignment is
  performed.



                                                                <Page Down> 
.P
  The program will update the corresponding values in the radio's RAM - not
  the EEPROM - to provide you with immediate feedback on the alignment.  The
  alignment values will be updated in the Workspace, but the radio's Codeplug
  must be programmed by pressing the appropriate function key for the align-
  ment to become permanent.  Programming from each of these screens will only
  update the parameters displayed on the screen.  Any other parameters in the
  radio will remain intact.  To update all the parameters in the radio, you
  must program the radio from the MAIN/GET-SAVE/PROGRAM RADIO Screen.






                                                                  <Page Up> 
