  VOLUME

  This feature adjusts the radio's internal volume attenuator. This
  attenuator is in series with the external volume control which is
  in turn adjusted by the user.  Volume values range from 0, for
  Minimum Audio, to 255, for Maximum Audio.  Values may be entered
  directly with the Numeric Keys, or scrolled through with the Up/
  Down Arrow Keys.
