  MVA VOLUME

  This feature adjusts the radio's internal volume attenuator for use
  in the MVA.  When in the MVA, the radio's external volume control is
  disabled and the audio level is adjusted by the MVA's volume control.
  Values range from 160 for minimum audio, to 225 for maximum audio.
