006810100000077376013000047191501500005809060150200612014019010068312602000007880360210000929811020010099471102230010454180225001143623030000127245103300015204380330101718309033020175660903400018049020340101813202035000182150203700018298240370101939804037100195912103711020577090400002095530042000225161404203023338070421002367407042110239372304212025208110421302574706042150260561404500026714130450302746114045040280211504507028610120450802899424045090300792404501031213110500003168426090000328842509300034071380930103598908093020363201109303036904090930403725614097000380672409701039343070970203960306097030398500709704040160070970504047207097060407360709707040999080000004126800.m
.p
.o
. 
----!-----------------------------------------------------------------!---
MAIN MENU                                                              1000
The  MAIN  Menu is the top level of the program from which you  select  the 
type of function that you wish to perform.  All selections are made via the 
"Function Keys",  labeled F1 thru F10,  on your keyboard.  Press the ESCape 
key to return to the MAIN Menu from anywhere in the program.
                                                                         
After  making a selection,  you will be directed to similar menus and /  or 
data  entry screens for RF alignment or codeplug data.   You must initially 
load  data from a radio (or  disk) via the F3 GET/SAVE function before  you 
will be permitted to CHANGE or VIEW any codeplug data.  Alternatively,  you 
may initialize a radio on the SERVICE:DEFAULT_MODEL screen. 

Call  Radius  Product Services (319) 385-9271 in  Mt.  Pleasant,  Iowa  for 
problems  not covered in your Radio Service Software User's manual or  your 
radio Service manual.
.P
MAIN MENU (cont)

Function Key Descriptions:

F1 - Additional  information  is available for every menu via the  F1  HELP 
     key.    Specific  help  is also available for each field on  all  data 
     entry screens.   Generic help is available within any HELP screen  via 
     the MORE HELP function.

F2 - SERVICE  is a multi-level menu that permits access to radio  ALIGNMENT 
     screens  for  adjusting  Transmitter  VCO  and  Reference   Oscillator 
     Deviation.    Refer  to  your  radio  Service  Manual  for  additional 
     information on radio alignment.
.P
MAIN MENU (cont)

     A radio must be connected to your computer via the RIB before you will 
     be  permitted  to access the SERVICE  screens.   All  SERVICE  screens 
     access the codeplug directly;  therefore,  you do NOT have to read the 
     codeplug  data  (via the GET/SAVE functions) before using the  SERVICE 
     screens.  
 
F3 - GET/SAVE is used to read codeplug data from a radio and/or retrieve an 
     archived  codeplug  from a diskette or hard disk for editing  purposes 
     (via  the  CHANGE/VIEW function).   GET/SAVE is also used  to  program 
     edited codeplug data back into the radio or to create an archive  file 
     on a diskette (or hard disk).  
.P
MAIN MENU (cont)

F4 - CHANGE/VIEW  is a multi-level menu that is used to  change,  view,  or 
     modify codeplug features and option configurations.    All HT50 / P100 
     codeplug  parameters  are classified as either RADIO-WIDE  or  CHANNEL 
     related.  CHANGE/VIEW permits access to each of these categories.

     Unlike  the  SERVICE function,  a codeplug must be  loaded  into  your 
     computer's  memory (via the GET/SAVE functions) before you can  access 
     the CHANGE/VIEW screens.   You may CHANGE/VIEW an archive file without 
     a radio connected.  

F5 - A  PRINT utility is available to produce permanent records of codeplug 
     configurations  and/or RF alignment settings.   A printer is  required 
     and should be connected to your computer per your instruction  manual.  
.P
MAIN MENU (cont)

F6 - A FILE MAINTENANCE utility is available to create sub-directory  paths, 
     delete old archive files, restore archive files, and create new back-up 
     files.

F7 - Not Used.

F8 - Not Used.

F9  - SETUP is used to configure your HT50 / P100 Radio Service Software to 
      your  particular  application.   Default disk  drives,  communication 
      ports,  and  even  screen colors may be customized to  your  specific 
      needs.

F10 - Select  EXIT  to  quit the program and return to DOS.   Be  sure  all 
      desired codeplug changes have been programmed back to the radio,  and 
      that  an archive copy has been made.   Otherwise all changes will  be 
      lost  since  returning  to DOS erases this data from  the  computer's 
      memory. 
.P
                            KEYBOARD OPERATION
                                                                            
      TAB (or ENTER):         Advance Cursor to Next Data Field            
      Shift TAB:              Backup Cursor to Last Data Field             
      UP / DOWN Arrow Keys:   Increment / Decrement Value or Selection     
      LEFT / RIGHT Arrow:     Move Cursor Within Data Field                
      INSERT:                 Insert Space at Current Cursor Position      
      BACKSPACE:              Erase Data Within Field & Move Cursor Left   
      DELETE:                 Erase Current Character                      
      PAGE UP / PAGE DN:      Scroll Displayed Data UP or DOWN             
      HOME:                   Move Cursor To Upper Left Data Field         
      F1:                     Help
      F2 - F8:                Execute Labeled Function                     
      F10:                    Return to the PREVIOUS Menu                  
      ESC:                    Return to the MAIN Menu                      
.P
FILE MAINTENANCE                                                       1500

The  File Maintenance Menu is designed to help you manage your  files.   It 
can  be used to restore lost Archive Files from your Back-up Files,  create 
new Back-up Files, create directory paths, and delete Archive Files.

.P
DELETE ARCHIVE FILE                                                    1502
The  Delete Archive File screen allows you to delete any Archive File  from 
the directory displayed in the Archive Path.

Function Key Descriptions:

F3 - The CHANGE ARCHIVE function allows you to change the Archive Directory 
     Path.  Enter the new Path and Press the Enter key.

F7 - The  DELETE  FILE function  will delete the file associated  with  the 
     highlighted  serial number.  You can move the highlight cursor to  the 
     desired  serial number by using the Tab and Enter keys.  Press  F7  to 
     delete  the file.  The Computer will ask you to confirm the delete  by 
     pressing F7 again.
.P
MOTOROLA Radio Service Software             HT50 / P100  Portable     1901   

                                            Model #........
                                            Serial #.......           
Serial #.............                       Software Ver...
Software Version.....                        
Date.................                       Band...........     

Part # (3 1/2).......RVN4021C  [HT50]
                     HVN9175C  [P100]

       (5 1/4).......RVN4022C  [HT50] 
                     HVN9176C  [P100]
Manual #.............68P81056C20   [HT50]               

RIB Part #...........01-80353A74   [HT50]
                     HLN9214A      [P100]
CABLE PART NUMBERS:                                    
  PC/XT -> RIB.......30-80369B71   [HT50]
                     HKN9215A      [P100]

  AT    -> RIB.......30-80369B72   [HT50]               
                     HKN9216A      [P100]

  RIB   -> Radio.....RTK4208B      [HT50]               
                     HKN9221A      [P100]
.P
SERVICE                                                                2000

All  radio alignment and board replacement procedures are accessed from the 
SERVICE  menu.   A radio must be connected to your computer via a  RIB  and 
battery  eliminator/programming cables  and the radio turned on before  you 
will be permitted to access  the SERVICE screens. 
                             !!!  WARNING  !!!

Do  NOT switch radios in the middle of any SERVICE procedure.   Always  use 
the EXIT key to return to the previous menu screen before disconnecting the 
radio.  

Call  Radius  Product Services (319) 385-9271 in  Mt.  Pleasant,  Iowa  for 
problems  not covered in your Radio Service Software User's manual or  your 
radio Service manual.
SERVICE (cont)

All  SERVICE screens read and program the radio codeplug directly;  you  do 
NOT  have to use the GET/SAVE functions unless you are editing or  printing 
data.   You  will be prompted at each SERVICE screen to save the new values 
before exiting the screen.

Refer  to  your  HT50 /  P100  Radio Service  Software  User's  Manual  for 
ALIGNMENT procedures.

.P
SERVICE (cont)

Function Key Descriptions:

F2 - The  VCO  DEVIATION  function  is  used  to  adjust  transmitter   VCO 
     deviation.  


F5 - The  REFERENCE  OSCILLATOR DEVIATION function adjusts reference 
     oscillator deviation.  
.P
UPDATE DEFAULT DATA FILE                                               2100

Enter  the 30 digit data string provided with the service bulletin.   After 
entering  the data press Enter.  The data contains error  detection  coding 
and  if  the data is incorrectly entered it will be detected by  the  Radio 
Service  Software.   If  the data is not correct you will  be  prompted  to 
correct  the  data.  If the data entered is for a model not  known  to  the 
Radio  Service  Software you will need a newer version of the  software  to 
service  this model.  If the data entered is correct the default data  file 
will be updated.
.P

BLANK BOARD INITIALIZATION                                             2001 

Four pieces of information are required to determine the default date to be 
programmed  into the EEPROM.  They are Model Name, Model Number,  Frequency 
Range, and Serial Number.

Use  the UP/DOWN arrow keys to select Model Name and Number, and  Frequency 
Range. Enter the serial number from the keyboard.  This information  should 
be found on the radio.

Press F8 to program the default data into the EEPROM.
.P
Tx VCO DEVIATION                                                       2230

Refer  to  your  HT50 / P100 Radio Service Software User's Manual  for  the 
DEVIATION ALIGNMENT procedure.

Transmitter  Deviation is increased or decreased by first keying the  radio 
via  F6,  and  then by pressing the UP/DOWN  arrow  keys  respectively.   A 
relative  deviation  value will be displayed,  but the  actual  transmitter 
deviation  must  be determined from your service monitor.   The radio  will 
transmit  on the channel selected by the channel selector (indicated on the 
screen) and should be terminated into a 50 ohm load or service monitor.   A 
time-out-timer of 3 minutes is enabled when the radio is keyed via F6.  The 
desired transmitter deviation range is 4.6 to 4.8 kHz.

Using  the  UP/DOWN  arrow keys,  adjust Tx VCO Deviation per  your  User's 
Manual.  Press F6 again to de-key the radio,  and then press F8 to  program 
the value to the radio.
.P

Tx REFERENCE OSCILLATOR DEVIATION                                      2250

Refer  to  your  HT50 / P100 Radio Service Software User's Manual  for  the 
REFERENCE OSCILLATOR DEVIATION procedure.

Transmitter  Reference  Oscillator Deviation is increased or  decreased  by 
first keying the radio via F6,  and then by pressing the UP/DOWN arrow keys 
respectively.  A relative deviation value will be displayed, but the actual 
deviation  must be determined from your service monitor.   

The  radio  will transmit on the channel selected by the  channel  selector 
(indicated on the screen) and will automatically be modulated with a 30  Hz 
PL tone for this adjustment.  A time-out-timer of 3 minutes is enabled when 
the  radio is keyed via F6.  The desired Reference Oscillator deviation  is 
between 670 and 750 Hz.   
                                 
Note:  The  F6  key  should  always be used to key the  radio  during  this 
       procedure,  otherwise  the 30 Hz tone will not be  generated.   This 
       tone is independent of all PL/DPL configurations.  

Using the UP/DOWN arrow keys,  adjust Tx Reference Oscillator Deviation per 
your User's Manual.  Press F6 again to de-key the radio,  and then press F8 
to program the value to the radio.
.P
GET/SAVE                                                               3000

The  GET/SAVE functions are used to transfer codeplug data from your  radio 
or an archive file into your computer in order for you to Change,  View, or 
Print it.  GET/SAVE functions also permit you to PROGRAM modified data back 
into your radio or to SAVE a copy of the codeplug data in an archive file.

                             !!!  WARNING  !!!

Do  NOT  turn  off  the  radio or disconnect it  from  the  computer  while 
attempting to PROGRAM the codeplug.   Interrupting the programming  process 
WILL destroy the codeplug contents and completely DISABLE the radio!    

.P
GET/SAVE (cont)

Function Key Descriptions:

F2 - The  READ CODEPLUG function reads the information (data) stored in the 
     radio codeplug (EEPROM) and transfers it to the computer's memory.

     A  radio and RIB must be properly connected to the computer and  power 
     turned on before you attempt the READ function.

     The  time  required  to READ a codeplug will depend directly  on  your 
     computer  type  and the size of the codeplug  you  are  reading.   The 
     status of the READ operation is displayed at the bottom of the screen. 
.P
GET/SAVE (cont)

F3 - The  GET  FILE  function is used to retrieve an archive  file  from  a 
     diskette or hard disk to the computer.   Once retrieved,  the file may 
     be  modified via the CHANGE/VIEW functions or programmed into a  radio 
     just  as  codeplug  information read from the radio via  the  F2  READ 
     function.

F7 - The  SAVE FILE function is used to create (or update) an archive  copy 
     of the codeplug information onto a diskette or hard disk.   An archive 
     copy  of every radio installed or serviced is STRONGLY recommended  in 
     order to be able to quickly restore customer information is case of  a 
     codeplug failure.  
.P
GET/SAVE (cont)

F8 - The PROGRAM CODEPLUG function is used to transfer codeplug information 
     from the computer to the radio codeplug.  

     A  radio and RIB must be properly connected to the computer and  power 
     turned on before you attempt the PROGRAM function.

     The  time required to PROGRAM a codeplug will depend directly on  your 
     computer  type and the size of the codeplug you are programming.   The 
     status  of  the PROGRAM operation is displayed at the  bottom  of  the 
     screen. 
.P
GET FILE                                                               3300

The  GET FILE function is used to retrieve an archive file from a  diskette 
or hard disk.  Once retrieved, the file may be modified via the CHANGE/VIEW 
functions or programmed into a radio just as codeplug information read from 
the radio via the F2 READ function.

Use  the TAB (or ENTER) key to select the serial number of the radio to  be 
retrieved.    The  corresponding  model  number,   customer  identification 
information,  and  the date the file was made will be displayed across  the 
middle  of  the screen.    The F8 function key is used to GET the  selected 
file as described below.
.P
GET FILE (cont)

Function Key Descriptions:

F2 - The  CHANGE  ARCHIVE function is used to specify  the  directory  path 
     where  the  archive file is to be located.   The default archive  path 
     will  always be the specified default path  from the SETUP  Menu  (See 
     MAIN MENU, F9).

F6 - The  ENTER S/N (serial number) function permits you to enter  directly 
     the  serial number of the file you wish to retrieve. 
     After entering the serial number, press ENTER and the computer will
    search the specified directory path to locate the file for that serial
    number.    The F8 function key is used to get the selected file
    as described below.
.P
GET FILE (cont)

F7 - The GET CURRENT function will read the serial number from the radio
     connected to the RIB and attempt to locate the archive file with the
     same serial number. The next step is to press F8 to get the archive    
     file. If the file is not found the command will abort and display a 
     warning message. The radio must be turned on to perform this function.    

F8 - The  GET SELECTED function is used to GET the archive file highlighted 
     on the screen.   After the file is retrieved, the computer will return 
     to the GET/SAVE menu.
.P
ARCHIVE PATH                                                           3301

Enter  the  directory path where the archive file is to  be  located.   

The  default archive path will always be the specified default  path   from 
the SETUP Menu (See MAIN MENU, F9).

Please  refer to your computer owner's manual for a complete description of 
directories and path names.
.P
SERIAL NUMBER                                                          3302

Enter  the  serial  number of the codeplug archive file that  you  wish  to 
retrieve and press ENTER.  The computer will search the specified directory 
path  to  locate the file if it exists.   Only the specified path  will  be 
searched.

Once the  file  is located,  press F8 to GET the SELECTED file.   A  Status 
message will inform you if the file does not exist on the specified path.
.P
TCMS UPDATE                                                            3400

.P
TCMS PATH                                                              3401

.P
CLONE RADIO                                                            3500

.P
SAVE FILE                                                              3700

The SAVE FILE function is used to create (or update) an archive copy of the 
codeplug information onto a diskette or hard disk.  If you are creating the 
file  on  a hard disk,  you will automatically be instructed to backup  the 
data onto a diskette. 

An optional 15-character name can be given to an archive file to facilitate 
tracking.  

You  are  STRONGLY  encouraged  to  make an archive  copy  of  every  radio 
installed  or  serviced  in order to be able to  quickly  restore  customer 
information is case of a codeplug failure.  
.P
SAVE FILE (cont)

Function Key Descriptions:

F2 - The  CHANGE  ARCHIVE function is used to specify  the  directory  path 
     where  the  archive file is to be located.   The default archive  path 
     will  always be the specified default path  from the SETUP  Menu  (See 
     MAIN MENU, F9).

F8 - The  SAVE FILE function executes the save process.   Do NOT  press  F8 
     until you have entered the customer identification information.  
.P
CUSTOMER ID                                                            3701

Enter  an  optional  15-character  (max)  name  for  the  archive  file  to 
facilitate tracking purposes. 
.P
BACKUP FILE                                                            3710 

The BACKUP FILE procedure is used to make a backup copy of any archive file 
SAVED on a hard disk.   If you are archiving to a diskette, you will NOT be 
prompted  for a backup.  

Diskette  backups should be handled via standard DOS file copy  procedures.  
Refer to your computer user's manual for additional information.

Function Key Descriptions:

F2 - The CHANGE BACKUP path function is used to specify the directory  path 
     where the backup file is to be located.   The default backup path will 
     always  be  the specified default path  from the SETUP Menu (See  MAIN 
     MENU, F9).
.P
BACKUP FILE (cont)

F8 - The MAKE BACKUP function executes the backup process.  After verifying 
     that  the Backup Path is correct and the backup diskette is installed, 
     press F8 to make the backup copy.   You will automatically be returned 
     to the GET/SAVE menu.
.P
BACKUP PATH                                                            3711

Enter  the  directory path where the backup file is to  be  located.   

The default backup path will always be the specified default path  from the 
SETUP Menu (See MAIN MENU, F9).

Please  refer to your computer user's manual for a complete description  of 
directories and path names.
.P
CHANGE/VIEW                                                            4000

CHANGE/VIEW is a multi-level menu that is used to change,  view,  or modify 
codeplug features and option configurations.    All codeplug parameters are 
classified  as either RADIO-WIDE or CHANNEL related.   CHANGE/VIEW  permits 
access to each of these categories.

Unlike the SERVICE function, a codeplug must be loaded into your computer's 
memory  (via the GET/SAVE functions) before you can access the  CHANGE/VIEW 
screens.  You may CHANGE/VIEW an archive file without a radio connected.  
.P
CHANGE/VIEW (cont)

Warning:  CHANGE/VIEW does NOT actually modify the radio codeplug data, but 
          instead  it  modifies  a  copy of the  data  retrieved  from  the 
          codeplug (or archive file) via the GET/SAVE functions.

          After  all  CHANGE/VIEW modifications  are  completed,  you  MUST 
          return to the GET/SAVE menu and PROGRAM the changes back into the 
          radio  or  SAVE  them  to a  new  archive  file.   Otherwise  the 
          modifications will be lost when you turn off your computer. 
.P
CHANGE/VIEW (cont)

Function Key Descriptions:

F2 - RADIO-WIDE  Configuration is used to CHANGE/VIEW radio parameters  and 
     options that affect overall radio operation, i.e. those not related to 
     a specific channel such as the time-out-timer. 

F5 - CHANNEL   Configuration  is  used  to  CHANGE/VIEW  channel   specific 
     information such as frequencies, squelch type and squelch codes.
.P
CHANGE/VIEW RADIO-WIDE CONFIGURATION                                   4200

RADIO-WIDE  Configuration  is  used to  CHANGE/VIEW  radio  parameters  and  
options that affect overall radio operation, i.e. those not just related to 
a specific channel such as the time-out-timer. 

Warning:  CHANGE/VIEW does NOT actually modify the radio codeplug data, but 
          instead  it  modifies  a  copy of the  data  retrieved  from  the 
          codeplug (or archive file) via the GET/SAVE functions.

          After  all  CHANGE/VIEW modifications  are  completed,  you  MUST 
          return to the GET/SAVE menu and PROGRAM the changes back into the 
          radio  or  SAVE  them  to a  new  archive  file.   Otherwise  the 
          modifications will be lost when you turn off your computer. 
.P
TIME-OUT-TIMER (TOT)                                                   4203

Use the UP/DOWN arrow keys to Enable or Disable the Time-Out-Timer.

If Enabled,  the TOT will limit the maximum time allowed for any continuous 
transmission to 60 seconds on all transmit channels.   Receive operation is 
not affected by the TOT.
.P
QUICK CALL                                                             4210

Use the UP/DOWN arrow keys to Enable or Disable the QUICK CALL II decoder.  

QUIK CALL II is compatible with PL/DPL Encode ONLY.   It is not compatible 
with PL/DPL decode.

.P
TONE A/B                                                               4211

Enter the QUIK CALL II decoder frequency directly in Hz (Ex:  1006.9).

Any QUIK CALL frequency between 288.5 Hz and 2468.2 Hz is valid.

Standard  codes may be selected via the UP/DOWN arrow keys.   The  standard 
QUIK CALL II decode frequencies are listed on the next page:
.P
TONE A/B (cont)

Standard QUIK CALL II Frequencies:

Freq     Freq      Freq      Freq      Freq      Freq      Freq      Freq
288.5    378.6     496.8     651.9     855.5     1122.5    1472.9    1930.2
296.5    389.0     510.5     669.9     879.0     1153.4    1513.5    1989.1
304.7    399.8     524.6     688.3     903.2     1185.2    1555.2    2043.8
313.0    410.8     539.0     707.3     928.1     1217.8    1598.0    2094.5
321.7    422.1     553.9     726.8     953.7     1251.4    1642.0    2155.6
330.5    433.7     569.1     746.8     979.9     1285.8    1687.2    2212.2
339.6    445.7     584.8     767.4     1006.9    1321.2    1733.7    2271.7
349.0    457.9     600.9     788.5     1034.7    1357.6    1781.5    2334.6
358.6    470.5     617.4     810.2     1063.2    1395.0    1830.5    2401.0
368.5    483.5     634.5     832.5     1092.4    1433.4    1881.0    2468.2
.P
GOOD RADIO ALERT TONE                                                  4212

Use the UP/DOWN arrow keys to Enable or Disable the Good Radio Alert Tone.

The  radio's microprocessor goes through a self check every time the  radio 
is  turned on.   If the Good Radio Alert Tone is enabled,  the  radio  will 
give  a short BEEP approximately 1 second after being turned on to indicate 
that it passed the self check. 

If  the tone is disabled,  the radio will still perform the self check  but 
the BEEP tone will NOT sound.
.P
Tx LED INDICATOR                                                       4213

Use the UP/DOWN arrow keys to Enable or Disable the Tx LED indicator.   

If the Tx LED is disabled,  the transmitter will function normally,  except 
that the transmit indicator will NOT light during PTT (Push-To-Talk).
.P
SERIAL NUMBER                                                          4215

The radio Serial Number, which is stored in the codeplug, can be viewed but 
cannot be changed.  

However, the serial number must be re-entered when the codeplug is changed.

After  the codeplug has been changed per your radio Service  Manual,  enter 
the old radio serial number from the radio label, beginning with the fourth 
digit.  The first three digits will be '672', '759', or '690'.     

After the serial number has been re-entered and the radio re-programmed (F3 
GET/SAVE  functions),  you will again only be permitted to view the  serial 
number.  
.P
CHANGE/VIEW CHANNEL CONFIGURATION                                      4500

CHANNEL  Configuration is used to CHANGE/VIEW channel specific  information 
such as frequencies, squelch type and squelch codes.

Warning:  CHANGE/VIEW does NOT actually modify the radio codeplug data, but 
          instead  it  modifies  a  copy of the  data  retrieved  from  the 
          codeplug (or archive file) via the GET/SAVE functions.

          After  all  CHANGE/VIEW modifications  are  completed,  you  MUST 
          return to the GET/SAVE menu and PROGRAM the changes back into the 
          radio  or  SAVE  them  to a  new  archive  file.   Otherwise  the 
          modifications will be lost when you turn off your computer. 
.P
RECEIVE FREQUENCY                                                      4503

Enter  the RECEIVE frequency directly in MHz.   

Optionally,  the  UP/DOWN arrow keys may be used to scroll through  allowed 
valid frequencies.

Blank RECEIVE frequencies are NOT allowed.  153.600 MHz is NOT available.  

The  channel  2  receive frequency can be up to 6 MHz from  the  channel  1 
receive frequency without degradation. 

Refer  to the MOTOROLA Catalog Sheets / Price Pages or your Service  Manual 
for valid RECEIVE frequencies for this model.
.P
TRANSMIT FREQUENCY                                                     4504

Enter  the TRANSMIT frequency directly in MHz.   

Optionally,  the  UP/DOWN arrow keys may be used to scroll through  allowed 
valid frequencies.

For a "Receive-Only" channel,  enter a B.   The TRANSMIT frequency will  be 
displayed  as BLANK.   

The  channel  2  transmit frequency can be up to 6 MHz from the  channel  1 
transmit frequency without degradation. 

Refer  to the MOTOROLA Catalog Sheets / Price Pages or your Service  Manual 
for valid TRANSMIT frequencies for this model.
.P
SQUELCH TYPE                                                           4507

Use  the UP/DOWN arrow keys to select the SQUELCH type: 


     CSQ - Carrier Squelch
     TPL - Private Line
     DPL - Digital Private Line.

Data fields for transmit and receive codes will be displayed for PL and DPL.

Cross coding (PL on Transmit, DPL on Receive, etc) is not allowed.
.P
PL SQUELCH CODE                                                        4508

Enter  the  PL  frequency  directly in  Hz  (Ex:   192.8),   or  enter  the 
alphanumeric code (Ex:  7A).

Enter a B for Carrier Squelch operation.

Valid codes may also be selected via the UP/DOWN arrow keys.

Standard PL frequencies are listed on the next page:
.P
PL SQUELCH CODE (cont)

Standard Private Line Frequencies / MOTOROLA Code:

Freq  Code    Freq  Code     Freq  Code     Freq  Code     Freq  Code     
67.0   XZ     91.5   ZZ      123.0  3Z      167.9  6Z      225.7  M4
69.3   WZ     94.8   ZA      127.3  3A      173.8  6A      229.1  9Z
71.9   XA     97.4   ZB      131.8  3B      179.9  6B      233.6  M5
74.4   WA     100.0  1Z      136.5  4Z      186.2  7Z      241.8  M6
77.0   XB     103.5  1A      141.3  4A      192.8  7A      250.3  M7
79.7   WB     107.2  1B      146.2  4B      203.5  M1
82.5   YZ     110.9  2Z      151.4  5Z      206.5  8Z
85.4   YA     114.8  2A      156.7  5A      210.7  M2
88.5   YB     118.8  2B      162.2  5B      218.1  M3
.P
DPL SQUELCH CODE                                                       4509
Enter  the  DPL  code  directly (Ex:  033);  note that  leading  zeros  are 
required.  

Enter a B for Carrier Squelch operation.

Valid codes may also be selected via the UP/DOWN arrow keys.

Valid DPL codes are listed on the next page:
.P
DPL SQUELCH CODE (cont)

Valid DPL Codes:

Code   Code    Code    Code    Code    Code    Code    Code    Code
023    071     134     223     306     411     503     631     732
025    072     143     226     311     412     506     632     734 
026    073     152     243     315     413     516     645     743    
031    074     155     244     331     423     532     654     754    
032    114     156     245     343     431     546     662         
043    115     162     251     346     432     565     664         
047    116     165     261     351     445     606     703         
051    125     172     263     364     464     612     712         
054    131     174     265     365     465     624     723         
065    132     205     271     371     466     627     731
.P
QUIK CALL                                                              4501

This  field  indicates  if the QUIK  CALL II decoder has  been  Enabled  or 
Disabled  for this mode.   

Use the UP / DOWN Arrow Keys to Enable or Disable QUIK CALL II.             
                                                                            
                   

QUIK  CALL II is compatible with PL/DPL Encode ONLY.   It is not compatible 
with PL/DPL decode.
.P
PRINT                                                                  5000

The  PRINT  function is  used to  produce  permanent  records  of  codeplug 
configurations  and/or  RF alignment settings.   A printer is required  and 
should  be  connected  to your computer per your  computer  user's  manual.  
Graphics capability is NOT required.  

You  must use the GET/SAVE functions to first READ or GET a  codeplug   for 
printing  radio configuration data (see F2 below);  you must have  a  radio 
connected to the computer for printing an alignment summary (see F7 below).

Each printout contains radio model and serial number information,  software 
version numbers,  Radio Service Software version numbers,  and the date and 
time of the printout.
.P
PRINT (cont)

Function Key Descriptions:

F2 - The  RADIO  CONFIGURATION function prints a summary of all  RADIO-WIDE 
     and CHANNEL information.

F6 - The  ARCHIVE  Files function prints a list of all  codeplug  files  by 
     serial number for a specified directory path.  

F7 - The  ALIGNMENT  Summary  function prints the  current  relative  value 
     setting for all SERVICE alignment adjustments.
.P
SETUP                                                                  9000

The  SETUP  functions are used to configure your Radio Service Software  to 
your particular application and computer environment. 

Function Key Descriptions:

F3 - PC  CONFIGURATION is used to set default disk drive paths for  Archive 
     files and Backup files.   It is also used to select which Asynchronous 
     Communications  Port  (COM 1 or COM 2) the RIB (Radio  Interface  Box) 
     will be connected to.

     Please   refer  to  your  computer  owner's  manual  for  a   complete 
     description of path names and Asynchronous Communication Ports.
.P
SETUP (cont)

Note:  Your  Radio  Service Software will automatically determine  at  what 
       clock  speed  your  computer  is  operating.    No   user-selectable 
       parameters are required.

F7 - SCREEN  COLORS  is  used  to enable the  Color  display  option.   The 
     standard  default  configuration for Radio Service Software is  for  a 
     MONOCHROME display monitor.   However, if you have a color system, the 
     display quality will be greatly enhanced by enabling the color option.  

.P
CONFIGURE COMPUTER                                                     9300

PC  CONFIGURATION is used to set default disk drive paths for Archive files 
and  Backup  files.    It  is  also  used  to  select  which   Asynchronous 
Communications  Port (COM 1 or COM 2) the RIB (Radio Interface Box) will be 
connected to. 

Please refer to your computer owner's manual for a complete description  of 
directory path names and Asynchronous Communication Ports.
.P
CONFIGURE COMPUTER (cont)

Function Key Descriptions:

F3 - COMM TEST is used to verify that your computer is set up properly  and 
     is able to READ and PROGRAM a radio codeplug properly.

     After  your  computer  and RIB are connected per  your  Radio  Service 
     Software  manual  and you have selected the appropriate  communication 
     port, turn on your radio and execute COMM TEST by pressing F3.  

     COMM  TEST will verify your system is functioning properly by  sending 
     commands  to  the  radio and checking for  the  proper  response.   No 
     codeplug changes will result from these commands.  An OK response will 
     be displayed in the Status Window if the system checks OK.
.P
CONFIGURE COMPUTER (cont)

     Otherwise,  error  messages will be displayed,  and you should consult 
     your manual for proper corrective action. 

F8 - SAVE  is used to save the configuration information to a file on  your 
     program  disk.   Every  time you use the Radio Service  Software,  the 
     configuration  that  you  SAVED last will be  used.   At  anytime  the 
     configuration may be changed and SAVED.

F9 - RESET  DEFAULT  is  used to reset the parameters on this screen  to  a 
     default   value.    However,   RESET   DEFAULT  does  NOT   save   the 
     configuration.   If the default values are desired, you must save them 
     via the SAVE (F8) function.
.P
ARCHIVE DISK DRIVE PATH NAME                                           9301

Enter the DEFAULT directory path where archive files are to be located.  

The GET/SAVE SAVE FILE function will default to this path.  

Please  refer to your computer owner's manual for a complete description of 
directories and path names.
.P
BACKUP DISK DRIVE PATH NAME                                            9302

Enter the DEFAULT directory path where backup files are to be located.  

The  GET/SAVE  BACKUP FILE function will default to this path  when  making 
backup  copies  of  codeplug  files archived to a hard  disk.  If  you  are 
archiving to a diskette, you will not be prompted for a backup. 

Diskette  backups should be handled via standard DOS file copy  procedures.  
Refer  to your computer user's manual for additional information  regarding 
coping files, directories, and path names.
.P
TCMS DISK DRIVE PATH NAME                                              9303

Enter  the  DEFAULT  directory path from where TCMS Update  files  will  be 
retrieved.  

The GET/SAVE GET TCMS file function will default to this path.  

Please  refer to your computer owner's manual for a complete description of 
directories and path names.
.P
SERIAL COMMUNICATIONS PORT (Default = COM 1)                           9304
 
Use  the UP/DOWN arrow keys to select to which Asynchronous  Communications 
Port (COM 1 or COM 2) your RIB (Radio Interface Box) is connected.  

If  you  are  not sure how your computer is configured or if you  have  two 
Asynchronous Communications Ports, first select COM 1 and use the COMM TEST 
(F3) function to communicate with a radio.  If the test fails, select COM 2 
and  repeat  COMM  TEST.   Be sure that all battery eliminators/programming 
cables  and power  supplies  are connected  per  the  instructions in  your  
Radio  Service  Software  User's manual.  

Please refer to your computer owner's manual for a complete description  of 
Asynchronous Communication Ports and how to configure them.
.P
CONFIGURE COMPUTER SCREEN                                              9700

SCREEN  COLORS  is used to select the type of display monitor that you  are 
using with your computer, i.e. MONOCHROME or COLOR.  

For  proper  color  operation,  you  must  have a  color  monitor  and  the 
appropriate color display interface card installed in you computer.  Please 
refer  to  your computer owner's manual and/or your computer dealer if  you 
have questions regarding the color capability of your computer.

You  may  also further customize your screen by selecting  colors  for  the 
screen TEXT,  STATUS LINE,  MESSAGE LINE,  TEXT HIGHLIGHT,  BACKGROUND, and 
SCREEN OUTLINE.
.P
Function Key Descriptions:

F8 - SAVE  is used to save the configuration information to a file on  your 
     program  disk.   Every time you use the Radio  Service  Software,  the 
     configuration  that  you  SAVED last will be  used.   At  anytime  the 
     configuration may be changed and SAVED.

F9 - RESET  DEFAULT  is  used to reset the parameters on this screen  to  a 
     default   value.    However,   RESET   DEFAULT  does  NOT   save   the 
     configuration.   If the default values are desired, you must save them 
     via the SAVE (F8) function.
.P
MONITOR TYPE (Default = Mono)                                          9701

Use  the UP/DOWN arrow keys to select either a MONOCHROME or COLOR  display 
monitor.

Screen configuration changes must be SAVED (F8) before you EXIT (F10)  this 
screen.
.P
TEXT (Default = Yellow)                                                9702

Use the UP/DOWN arrow keys to select the desired color for screen TEXT.  

Screen configuration changes must be SAVED (F8) before you EXIT (F10)  this 
screen.
.P
STATUS LINE (Default = White)                                          9703

Use  the UP/DOWN arrow keys to select the desired color for the STATUS LINE 
located in the lower portion of the top right-side window.

Screen configuration changes must be SAVED (F8) before you EXIT (F10)  this 
screen.
.P
MESSAGE LINE (Default = White)                                         9704

Use the UP/DOWN arrow keys to select the desired color for the MESSAGE LINE 
located in the upper portion of the top right-side window.

Screen configuration changes must be SAVED (F8) before you EXIT (F10)  this  
screen.
.P
HIGHLIGHT (Default = White)                                            9705

Use the UP/DOWN arrow keys to select the desired color for the  HIGHLIGHTED 
screen text.

Screen configuration changes must be SAVED (F8) before you EXIT (F10)  this 
screen.
.P
BACKGROUND (Default = Blue)                                            9706

Use  the  UP/DOWN  arrow keys to select the desired color  for  the  screen 
BACKGROUND.

Screen configuration changes must be SAVED (F8) before you EXIT (F10)  this 
screen.
.P
SCREEN OUTLINE (Default = Lt Red)                                      9707

Use  the  UP/DOWN  arrow  keys to select the desired color  of  the  screen 
OUTLINE.  

Screen configuration changes must be SAVED (F8) before you EXIT (F10)  this 
screen.
.P
     
 
screens.  You may CHANGE/VIEW an archive file without a radio connected.  
.P
CHANGE/VIEW (cont)

Warning:  CHANGE/VIEW does NOT actually modify the radio codeplug data, but 
          instead  i